Title: 14/FA Diesel Essentials (DESL-1595-32)

Home Page
  DESL 1595 Diesel Essentials Course Overview
  DESL 1592 32 Diesel Essentials Course Syllabus
  Handouts
    Metric to standard Conversion chart
    Torque wrench manual
    basic tool set recommended
    Recommended tool list
    Recommended tool list
  Web Links to Tools Demonstrations
    Dial indicator reading practice
    Vernier Caliper reading
    Metric outside micrometer practice
    Outside Standard Micrometer reading practice
    Verneir Outside Micrometer reading practice
    Depth Micrometer practice
    Metric Internal Micrometer practice
    Dial Caliper practice
    Fractional Digital dial caliper
    Tape measure in fractions of an inch
  Tool Providers Web Sites and Technical Education Discount Links
    Snap-On Tools Catalog
    Snap-On Tools Tech Education Program
    MAC Tools Catalog
    Student Tech Program
    Matco Tools Catalog
    Matco Tools Tech Ed Program
    Wright Tools
    Proto Tools
    Harbor Freight Tools
    Craftsman Tools
    Cornwell Tools
Assignments
Learning Modules
Student HelpZone