Title: Audiological Examination
Course: 15SP-HIS-120-W02-A & P OF AUDITORY AND SPEECH > Section: Lessons

Once again, you will visit the Martin and Clark website to view an Audiological Examination.  Pay particular attention to the interaction between the patient and the examiner.  Patient care is of utmost importance for all practitioners.  Below is a screenshot of what you will see upon entering the site, where you will select Audiometric  Evaluation as the video to review.