Title: Lesson
Course: Programmable Logic Controls (IC 107-IC 107) > Section: Web Content

This week there isn't a reading assignment, you have covered a lot of material and this should give you some time to review for the final written test.
The finals you will find in the coursework section are:
The final simulation project is lengthy and challenging, it could easily take 4 hours or more to finish, so start on it before the last day and give yourself some time to think it through.
You will also need to finish the last 2 faults of the "Troubleshooting PLC Circuits software.
Final Written Test