Title: Capacitive Reactance Lab
Course: Electrical Theory (IC 101-IC 101) > Section: Assessments

A: 1 = 7.071V; 2 = 7.071mA; 3 = 50mW; 4 = 7.071V; 5 = 7.066mA; 6 = 505.188nW

Q: Which measurement is noticeable different for the two components?
- voltage
- wattage
- amperage
A: voltage