Title: Series/Parallel Circuit Lab
Course: Electrical Theory (IC 101-IC 101) > Section: Assessments

A: 1 = 14.282 mA; 2 = 9.535 mA; 3 = 4.761 mA; 4 = 14.286 mA; 5 = 28.571 V; 6 = 19.047 V; 7 = 9.524 V; 8 = 71.429 V; 9 = 19.98 mA; 10 = 19.995 mA; 11 = 14.211 micro A; 12 = 20.0 mA; 13 = 2 micro V; 14 = 1774 micro V; 15 = 226.169 micro V; 16 = 100 V; 17 = 12.506 mA; 18 = 15.506 mA; 19 = 14.211 micro A; 20 = 12.5 mA; 21 = 37.499 V; 22 = 1.65 mV; 23 = 37.497 V; 24 = 62.501 V