Title: AC Worksheet
Course: Electrical Theory (IC 101-IC 101) > Section: Assessments

Q: Average=
A: 159.25V

Q: Frequency=
A: 100M Hz

Q: Peak=
A: 250V

Q: RMS=
A: 176.75V

Q: Average=
A: 38.22V

Q: Frequency=
A: 500K Hz

Q: Peak-to-Peak=
A: 120V

Q: RMS=
A: 42.42V