Title: 14SU-HIS-270-G101-CLINICAL PRACTICUM II

Syllabus
  Syllabus
Dropbox
  OTC_MoHEALTHWINs Grant License and Disclaimer for HIS 270 Blackboard Course
  Clinical Evaluation 1
  Clinical Evaluation 2
  Clinical Evaluation 3
  Clinical Evaluation 4
  Clinical Evaluation 5
  Week 6 Dropbox
  Week 7 Dropbox
  Week 8 Dropbox
Resources
  Unit I - The Human Ear: IHS Distance Learning Course Test Questions
  Unit II - Audiometric Testing: IHS Distance Learning Course Test Questions
  Missouri Division of Professional Registration
  HIS Program Page
  OTC Academic Calendar
  LDL Powerpoint Beth Fernandez
  LDL PDF Beth Fernandez
Need Help?