Title: Some additional study tools from Melissa Morales
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

FYI,

I have not checked all the questions, but take a look. More resources to hopefully help you all prepare for the Final Exams and Boards. You will need to copy and paste into your browser.

Thank you, Pat.  It's obvious you've applied yourself, and you're right about practicing.  I found some flashcards that might be helpful to everyone in studying for the written exam.  Some of the questions overlap, but I've found them helpful:

http://www.coursehero.com/flashcards/426853/Hearing-Instrument-Specialist/

http://www.cram.com/flashcards/quiz-review-ii-3138028

http://www.cram.com/flashcards/review-of-quizes-3134521

Hope that helps!

Melissa