Title: Reading Assignment
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

Your reading assignment is as follows for Unit 3, as we continue to focus on Hearing Instrument Fitting Goals and Patient Counseling.

Taylor and Mueller Chapter 10 from Fitting and Dispensing Hearing Aids.

Also in your Lessons folder you will see a link to the Hearing Review titled How Flow Charts Can Help Troubleshoot Hearing Aids. Please read this article for later discussion.

As a reminder, your reading from Unit 2 was:

- Chapters 5 and 6 from Taylor and Mueller, Hearing Instrument Fitting
- Chapters 7 and 8 from Mueller, Ricketts and Bentler