Title: Assignment 6.3 WebQuest Patient Counseling Manual
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

This assignment is not due until Unit 6, however, I am posting it early so that you can begin to gather your resources.

Visit the following Link to my WebQuest Assignment page which will give you full instructions, resources to access, as well as a Grading Rubric that you can review to prepare your assignment for grading.

Your manual will be due the weekend of November labs, either the 7th of November, or the 14th of November.  If you prefer to send me a digital file of the manual that will be acceptable as well, via email.

Patient Counseling Manual