Title: Friday, March 28th Agenda
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Resources

Agenda

Friday, 11/15

1. Audiometry or Open Book Group Exams
2. The Audiometric Footprint
3. HI Programming
4. Real Ear Measurements for Validation/Verification