Title: Unit 2 Reading Assignment
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

Your reading assignment for Unit 2 is:

Chapters 5 and 6 from Taylor and Mueller, Hearing Instrument Fitting

Chapters 7 and 8 from Mueller, Ricketts, and Bentler, Modern Hearing Aids

I realize this is a LOT of reading, know that this reading will take us through the end of Unit 3, so if you do not get all of this reading in this week, you will have the same reading for next week, so the reading assignment can be completed over the next two weeks to keep you on track.