Title: Final Exam Dates
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

Your final exam will open on November 28th at 9 am CST and will remain open until Wednesday, December 10th at 6pm CST. Your final will be 100 questions, all worth 1 point each. You will be able to print the exam to use for future review, after finals have ended.  You will be able to print the exam up through 12/10/14.  Best of luck!