Title: Lab Agenda Friday and Saturday, 3/28/14 and 3/29/14
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Resources

HIS Cohort B

HIS 250 Labs

Friday, March 28, 2014

9am-4pm

LCN 207

9:00-9:45                     State statutes and rulings, Review of the Amended Application and news from MHS Convention 2014, Q&A

9:45-10:15                   SHOW AND TELL

10:15-10:30                 Break

10:30 sharp to 12:15   Patient Counseling and ANSI Workbooks-Group 1-Lynn

12:15-1:30                   Lunch

1:30-3:00                     Breakout Sessions

Group 1 Impressions and Earmolds/Tubing/Modifications and Programming-Lynn/Becca

Group 2 Audiometry-Jackie and Becca

We will be using LCN 137 and LCN 207, as well as HIS Lab if needed.

3:00-3:15                     Break

3:15-4:00                     Audiometric Interpretation and Fitting Recommendations Group Assignments/Presentations

Saturday, 3/29

9am-4pm

LCN 207

9am-10am                  FDA Questions, Medical Clearance/Medical Waivers,  Q&A-whole group

10:00-10:15               Break

10:15-11:30               Group Breakout Sessions-Using LCN 137 and LCN 207

Group 2 Audiometry-what to expect for Practicum Exam-Jackie/Becca-also a Patient to test

Group 1 Testing

11:30-12:45                Lunch

1:00-1:30                   Group 2 Practice Written Exam

1:30-3:00                   Group 1 Audiometry

3:00-4:00                   Test Review

Attached Files: | - HIS 250 Cohort B Lab Agenda.docx