Title: Unit 1 Reading Assignment
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

Your reading assignment for Unit 1 is as follows:

Taylor and Meuller's textbook, Fitting and Dispensing Hearing Aids, Chapter 1

Modern Hearing Aids by Mueller Ricketts and Bentler, Chapter 3, Speech Acoustics.