Title: Unit 1 Audiologic Rehabilitation
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Lessons

Welcome to Unit 1 of HIS 250 Real Ear Measurements. In Unit 1, we will explore the various aspects of audiologic rehabilitation.

What will we learn?

1. Psychosocial aspects of hearing loss and rehabilitation
2. Counseling basics
3. When to refer the patient
4. Hearing Instrument Candidacy

The tasks we will complete for Unit 1 are as follows:

- Reading Assignment
- Discussion Board 1.1 "My patients and I"
- Video Presentation on HL Psychosocial Aspects and Counseling, Aspects of AR, and Patient/Client Assessment and Management
- Quiz 1.2

Have a great week of listening and learning, and reading, and more reading. Sorry! I promise the reading will get lessened as the course goes on.

Lynn Royer