Title: K Lee Case Study
Course: 14FA-HIS-250-H1B1-REAL EAR MEASUREMENTS > Section: Resources

Ken Lee is a carpenter/cabinet maker who still at 83 continues to work part time. He has worn ITC instruments for over 20 years. He is currently wearing his 4th pair of ITC's that he has worn for over 6 years. His hearing has worsened over the last 2 years.  He is currently wearing his ITC's at full on gain.  He is having difficulty hearing in noise.  His native language is Korean and he has difficulty hearing his wife when the TV is on.  Mr. Lee is ready for new aids. What choices may you suggest for Mr. Lee?

Attached Files:
- K Lee Audio(1).PNG
- K Lee Speech Testing.PNG