Title: 14SU-HIS-240-GH101-COMP & DIGITAL FEATURES OF HI

Syllabus
  Syllabus
    HIS 240 Syllabus
  Important OTC Dates
Lessons
  OTC_MoHEALTHWINs Grant License and Disclaimer for HIS 240 Blackboard Course
  Unit 1 Aspects of Compression in Digital Hearing Instruments
    Unit 1 Objectives
    Unit 1 Reading Assignment
    Unit 1 Lecture Materials
      Basic Hearing Instrument components.pdf
      Amplifiers, Dampers, and Acoustic Plumbing.pdf
      HI compression strategies overview.pdf
    Unit 1 Checklist
  Unit 2 Programmable Properties in Digital Hearing Instruments
    Unit 2 Objectives
    Unit 2 Reading Assignment
    Unit 2 Lecture Materials
      Channels Bands Compression
      Test Box and ANSI
    Summary of Objectives and Assignments
  Unit 3 Directional Mics and Digital Noise Reduction
    Midterm Review
    Unit 3 Objectives and Learning
    Unit 3 Readings
    Clinic Comments To Date
    Lecture Materials and Notes
      Common Digital HI Algorithms PDF
      Speech In-Noise and Directional Mics PDF
  Unit 4 Algorithms and Their Application
    Unit 4 Algorithms and Their Applications
    Reading Assignment for Unit 4
    Lecture Materials and Notes
      communication effects of auditory deprivation
      stimulating phonemic information with in the residual auditory area
      defining stimulating residual hearing ability
    Summary of Tasks to be completed
    Midterm Review
  Unit 5 Challenges with Digital Hearing Instrument Application
    Unit 5 Recognize the various challenges associated with digital hearing instrument application to revealed precipitous HF hearing losses
    Readings
    Unit 5 Summary of Items to Complete
  Unit 6 Asymmetrical Residual Hearing Ability and Binaural Fittings
    Lecture Materials and Notes
      Listing of Power Points for Unit 6
      Ear Canal Occlusion
      Occlusion Physiology Ear Mold
      removing earplug
      Dir Mics Dig.
      Ear Canal Occlusion Physical Challenges II
    Unit 6 Objectives
    Unit 6 Readings
  Unit 7 Counseling Strategies
    Final Exam Dates
    Unit 7
    Unit 7 Readings
    Lecture Materials and Notes
      effectivepatient-professionalinteraction.pptx
      conveyinginformationtopatientclient.pptx
      marketpenetrationpatientcounseling.pptx
    Final Review
  Unit 8 Week for Comprehensive review
Dropbox
  FINAL SUMMER 2014
  HIS 240 Quiz 1.3
  2.2 Hearing Instrument Jargon
  HIS 240 Quiz 2.4
  4.2 Audiogram Interpretation and Recommendation for Amplification
  HIS 240 Mid Term
  HIS 240 Quiz 5.3
Resources
  Voice Authoring Tutorial
  Purdue APA Link
  Lab Materials July Cohort A
    Cohort A July 19 and July 20 Tentative Agenda
    Tentative Agenda
    Case Studies
      Case Studies Zipped File
      Hearing Instrument Candidacy
      Hearing Instrument Candidacy Part II
      Martin and Clark Website
      AudSim Case Studies
  Lab Materials 6/21/13 FRIDAY
    Friday, 6/21 Objectives
    Saturday, 6/22 Objectives
  James Madison University Cornell Note Taking
  OTC Online
  OTC Bookstore
  Cochlear Fluid Lab Washington University
  Audiology Online Publication
  The Journal of Speech, Language and Hearing Research
  The Hearing Journal
  Proctoring FAQ's
  Pearson Higher Education Site, Martin and Clark
  Hawke Library
  Patient Six with BC scores.PNG
  Lab Materials HIS 240
    Lab Schedule and Agenda for Cohort B Labs September 2013
    Case Studies
      Case Studies Zipped File
      Hearing Instrument Candidacy
      Hearing Instrument Candidacy Part II
      Martin and Clark Website
      AudSim Case Studies
      KW Case
      KW Audiogram Information
      KW Audiogram Without Speech
      Programming Software Evaluations
      Case Study 2
        Case History
        Limited Audiogram
      Jerry Smith Case History
        Jerry Smith Case History
        Jery Smith Case History
    Cohort A July 19 and July 20 Tentative Agenda
    Alzheimers vs Hearing Loss Handout
    Delivery and Follow Up Care PP
    Good Hearing is Good Health
    Etymotic Impression Video
    Taking an Earmold Impression
    Earmold Impression 4 min video
    Westone Ear Impression Techniques
    Cohort B Ear Impression Video OTC St Charles Labs
    Motivational Pep Talk from Kid for President
    Case History 3
      Kimberly Howland
      Case History 3
Need Help?