Title: Discussion Board 2.3 Clinical Applications
Course: 14SU-HIS-240-GH101-COMP & DIGITAL FEATURES OF HI

Discuss the potential clinical application and implications of output limiting and wide dynamic range compression.  Please post your initial response no later than Thursday, 6/12 at 11:59PM.  Your reponse posts are due no later than Sunday, 6/15 at 11:59PM.