Title: Unit 6 Objectives
Course: 14SU-HIS-240-GH101-COMP & DIGITAL FEATURES OF HI > Section: Lessons

In Unit 6 we will be exploring the effects of asymmetrical residual hearing ability and binaural digital hearing instrument fittings.

Below are the objectives for this unit of study:

1. Achieving binaural fusion (not binaural balancing) in asymmetrical hearing loss
2. Understand the definition of asymmetrical hearing loss
3. Recognize residual hearing ability with asymmetry
4. We will explore earmold materials and earmold sound  pathways, venting and coupling systems
5. Speech mapping with various couplers will be discussed

Have a wonderful week of learning,

Dr. Willbanks