Title: Unit 3 Readings
Course: 14SU-HIS-240-GH101-COMP & DIGITAL FEATURES OF HI > Section: Lessons

Your Unit 3 reading assignment is from the Compression for Clinicians, by Ted Venema, Chapters 7 and 8.