Title: Programming Software Evaluations
Course: 14SU-HIS-240-GH101-COMP & DIGITAL FEATURES OF HI > Section: Resources

In an attempt to better understand programming software, check the following in the manufacturers' software to assure you can find these features and find understanding in their function.

- Ease of use
- Features
- Acoustical Parameters
- Programs/memories
- Family of curves
- In Situ Audiometry
- Integrated Auto Programming
- Fit Assistant/Expert Assistant
- Binaural Synchronization
- Feedback Manager
- Physical Fitting Recommendations
- Serial/Model Numbers -where located?
- Data Logging
- Learned Changes
- Default Fitting Formulas
- Directionalilty
- Expansion
- Comfort Level
- Speech Mapping/REM
- Swap Fitting

Are these features present?  How will they benefit a patient?