Title: 5.9- What's Next
Course: 14SU-HIS-230-GH101-ADVANCED AUDIOMETRY > Section: Lessons

In week six we will review tympanometry/ipsilateral reflexes and how these tests can be used by the hearing instrument specialist.  We will also take a look at available equipment and evaluation cost vs. benefit of adding this equipement.