Title: 2.4 Quick Check
Course: 14SU-HIS-230-GH101-ADVANCED AUDIOMETRY > Section: Lessons

Item | Due | Points
Read Pure Tone Adiometry & Masking Ch. 5 & 6 | Sunday June 15 |
Read Intro to Audiology Ch. 6 | Sunday June 15 |
Review Lesson 2 Materials & Presntations | Sunday June 15 |
First Discussion Forum Post | Thursday June 12 | 5
Additional Discussion Forum Posts | Sunday June 15 | 5
Complete Lesson 2 Quiz | Sunday June 15 | 20