Title: 3.3 Lesson Three Quiz
Course: 14SU-HIS-230-GH101-ADVANCED AUDIOMETRY > Section: Lessons

Q: We measure the SRT in percent of correct responses.
- True
- False
A: False
If wrong: Remember the SRT is the lowest level the client can repeat spondee's 50% of the time. The WRS is measured in percent of correct responses.

Q: The SRT should agree with the pure tone average of 500 and 1kZ when the hearing loss is steeply sloping.
- True
- False
A: True
If wrong: Check again. For a steeply sloping hearing loss it is better to use a two frequency average instead of three.

Q: The presentation level of the QuickSIN is based on the patient's WRS.
- True
- False
A: False
If wrong: The QuickSIN is presented at six different signal-to-noise ratio levels.

Q: The QuickSIN and the ANL are basically the same test.  You can use either one.
- True
- False
A: False
If wrong: The QuickSIN measure's the client's ability to understand in background noise while the ANL measures the level of background noise the client finds acceptable while listening to speech.

Q: The standard procedure for WRS testing states you can stop if the client gets the first ten words correct.
- True
- False
A: False
If wrong: While you may hear this from some hearing care professionals it is not an accepted procedure. You should continue with the full word list.

Q: The QuickSIN and the ANL each add about 5 minutes to the evaluation time.
- True
- False
A: True
If wrong: Each of these tests only takes about five minutes. A short amount of time to learn valuable information that may impact the hearing instrument fitting.

Q: To administer the ANL cold running speech is presented at the client's MCL and the white noise is introduced in the same channel and increased until the client says they can no longer tolerate the noise.
- True
- False
A: False
If wrong: To administer the ANL cold running speech is presented at the client's MCL and the multi-talker babble is introduced in the same channel and increased until the client can no longer tolerate the noise.

Q: If all the thresholds in both ears are within normal limits by air conduction we do not need to perform bone conduction testing.
- True
- False
A: True
If wrong: If all air conduction thresholds are normal then there is no concern that an air bone gap will be present.

Q: Two commonly used word lists for WRS are the W-22s and the NU6.
- True
- False
A: True
If wrong: These are the two most commonly used word lists.

Q: This question is a freebie for everyone.  I know it has been a tough couple of weeks getting started.  If you answer true to this question you get it right!
- True
- False
A: True
If wrong: You didn't really get this one wrong did you?