Title: 3.2 Reading Assignment
Course: 14SU-HIS-230-GH101-ADVANCED AUDIOMETRY > Section: Lessons

- Martin, Introduction to Audiology, Chapter 5, Speech Audiometry, Pages 101-129.  Continue to read and review this chapter.
- Go to Audiology Online and access course #15802, Mueller & Johnson, Fitting Hearing Aids: A Comparison of Three Pre-Fitting Methods.
- Go to Audiology Online Articles, Freyaldenhoven, Acceptable Noise Level (ANL): Research and Current Application.