Title: 4.0 Lesson Four Objectives
Course: 14SU-HIS-230-GH101-ADVANCED AUDIOMETRY > Section: Lessons

As a result of this lesson the student will:

- Review course material covered up to this point
- Understand how it relates to information previously covered in other courses
- Complete the midterm exam