Title: Objectives
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS > Section: Lessons

1. Determine residual hearing parameters
2. HI gain and audibility plus HI output and comfort
3. Audiometry results and audible are stimulation
4. Determining patient/client residual hearing ability
5. Patient/client counseling based upon residual ability
6. Realistic expectations for communication function
7. Describe the purpose for complete auditory stimulation
8. The dynamic range of speech phonemes
9. The affects of reduced auditory stimulation

Please remember any questions you may have post them to the Q&A Discussion Board so that we all may learn together.  Also you may contact me via the proper methods provided in your Syllabus.

Again, I am so excited to be working with each of you and learning together in the course.

Happy Learning......