Title: Objectives
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS > Section: Lessons

1. The size and location of the cochlea
2. Locate the various scala and their fluids
3. Endolymph & perilymph differences
4. The traveling wave & basilar membrane organization
5. Inner hair cell detail
6. Outer hair cell detail
7. Stereocillia/efferent motor unit
8. The travelling wave & hair cell reaction
9. Effects of damaged OHCs
10. Effects of damaged IHCs
11. Otoacoustic emissions & hair cells
12. Hearing Aid history overview
13. Linear hearing instruments overview
14. Fitting formulae for linear instruments

Please remember any questions you may have post them to the Q&A Discussion Board so that we all may learn together. Also you may contact me via the proper methods provided in your Syllabus.

Wow, doesn't that sound like fun? Of course it does! Below are the assignments/tasks that will be completed by the end of the week.

1. Your reading assignment is Venema pages 1-52, which is Chapters 1, 2 and a few pages of Chapter 3.
2. Review all presentations located in your Lecture Notes and Presentations folder
3. Discussion Board 1.1 IHC's and OHC's initial post due by Thurs, 3/20 at 11:59 PM, response posts due by Sun, 3/23 at 11:59 PM
4. Quiz 1.2 due by Sun, 3/23 at 11:59 PM

Have a great week of learning!

Dr. Senay