Title: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS

Syllabus
  Course Syllabus
    Course Syllabus
  Course Calendar
    Course Calendar
      Course Calendar
  Discussion Board Guidelines
    Discussion Board Rubric
  Proctoring FAQ's and Information-Important
  Information on Rules for Licensure in Missouri
Lessons
  OTC_MoHEALTHWINs Grant License and Disclaimer for HIS 150 Blackboard Course
  Unit 1 The Cochlear Compressor
    Objectives
    Unit 1 Lecture Materials and Presentations
      Cochlear Anatomy and Physiology Overview
      Hair Cell Function and Purpose
      Damaged Hair Cells and Hearing Loss
      Audibility and Linear Hearing Aids
    Summary of Learning and Completion of Unit 1
  Unit 2 Fitting Methods
    Objectives
    Unit 2 Lecture Materials and Presentations
      Unit 2 Lecture
      Linear Hearing Instrument Fitting Methods
      NAL & Compression
      DSL and Compression
    Summary of tasks to be completed
  Unit 3 Auditory Deprivation and Phonemic Regression
    Objectives
    Unit 3 Lecture Notes and Presentations
      Unit 3 Lecture
      Additional Information You may find helpful
    Let's Review Unit 3
  Unit 4 Physical and Neural Occlusion
    Objectives
    Unit 4 Lecture Notes and Presentations
      Ear Canal Occlusion- The Physical Challenges I
      Ear Canal Occlusion- Physical Challenges II
      Occlusion Effects- The Neural Challenges
      Removing the Ear Plug Effect
    4.3- Unit 3 Case Study answers
    Summary of Learning and Completion of Unit 4
  Unit 5 More Defining the Difference Between Physical and Neural Occlusion
    Objectives
    Unit 5 Lecture Notes and Presentations
      Lecture Notes and Video Presentations
      Ear Canal Occlusion- The Physical Challenges
      Ear Canal Occlusion Physical Challenges
      Occlusion Effects-The Neural Challenges
      Removing the Ear Plug Effect
      Linear Hearing Instrument Fitting
      NAL and Compression
      DSL and Compression
    Summary of Learning and Completion of Unit 5
  Unit 6 Understanding Tympanometry
    Objectives
    Reading Assignment
    Unit 6 Lecture Materials and Presentations
      Reading
      Tympanometry and Reflex Pathways
      Tympanometry Stimuli
    Summary of Learning and Completion of Unit 6
  Unit 7 Assess Patient/Client Residual Auditory Ability and Create Successful Aural Rehabilitation
    Objectives
    Unit 7 Lecture Notes and Presentations
      Defining & Stimulating Residual Hearing Ability.pdf
      Patient Client Counseling & Aural Rehab.pdf
      Stimulating Phonemic Information within the Residual Auditory Area.pdf
      Defining and Stimulating Residual Hearing Ability
      Patient Client Counseling and Aural Rehabilitation
      Stimulating Phonemic Information within the residual auditory area
    Let's Review Unit 7
  Final Course Review
    Notes on all units that may be helpful
    OTC's Proctoring FAQ's
    OTC's Understanding the Proctored Exam
    Off Campus Proctoring Agreement
  Comprehensive Final Exam
Dropbox
  Quiz 1.2 HIS 150
  Quiz 2.2 HIS 150
  HIS 150 Mid Term Assessment
  HIS 150 Quiz 4.2
  Assignment 5.1 Auditory Pathways
  HIS 150 Quiz 6.2
  HIS 150 Quiz 7.1
  HIS 150 Final
Resources
  Textbooks Required
  OTC Online
  OTC Bookstore
  OTC Financial Aid
  Cochlear Fluid Lab Washington University
  Audiology Online Publication
  The Journal of Speech, Language and Hearing Research
  The Hearing Journal
  Proctoring FAQ's
  Off_Campus_Proctoring_Arrangement_Form.pdf
  Auditory Pathways of the Brain
  Peripheral Auditory Stimulus and Brain Activity
  The Reticular Formation
Need Help?