Title: 2.1 Discussion Dynamic Range
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS

In your own words, describe to me what the meaning of dynamic range is, how does it benefit or hinder a patient, and what are the consequences of reduced dynamic range.  Please also provide examples that you have witnessed in the clinic, if possible.  You may even ask a mentor for some examples, and what was their explanation? Dynamic range is a very important topic, so let's see some good examples and have some good discussion.  I want each of you to be able to recognize it in the clinic. Your initial posts are due Thurs, 3/27 at 11:59pm and your response posts are due no later than Sun., 3/30 at 11:59pm.