Title: Objectives
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS > Section: Lessons

The following objectives will be discussed in Unit 2.
- History of fitting formulae
- Fitting formulae and audibility
- Linear based fitting methods
- Damaged cochlear response and HI response
- Compression amplification vs damaged cochlear compressor

Below are your assignments and/or tasks to be completed for Unit 2:

1. Your reading assignment is Venema pages 52-119, Chapters 3 through half of Chapter 5.
2. Quiz 2.1 due Sunday, 3/30 at 11:59 PM
3. Review presentations in your Lecture Notes and Presentations folder.

Please remember any questions you may have post them to the Q&A Discussion Board so that we all may learn together.
Have a great week!

Dr. Senay