Title: Objectives
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS > Section: Lessons

The objectives are as follows for Unit 5:

1. The physics of occlusion
2. The psychoacoustics of physical occlusion
3. Effects of bone conduction upon occlusion
4. Sound pressures and psychoacoustics of occlusion
5. Differentiate between physical and neural occlusion
6. The physics of neural occlusion
7. The psychoacoustics of neural occlusion
8. Challenges of hearing instrument fittings and occlusion

More on occlusion.  Occlusion can be a big issue in fitting hearing instruments so it is important you have a thorough understanding of the concept.  Have a great week of learning!

Dr. Senay