Title: Objectives
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS > Section: Lessons

1. The physics of occlusion
2. The psychoacoustics of physical occlusion
3. Effects of bone conduction upon occlusion
4. Sound pressures & psychoacousitcs of occlusion
5. Differentiate between physical or neural occlusion
6. The physics of neural occlusion
7. The psychoacoustics of neural occlusion
8. Challenges of HI dispensing & occlusion

Please remember any questions you may have post them to the Q&A Discussion Board so that we all may learn together.  Also you may contact me via the proper methods provided in your Syllabus.

Below are the tasks and assignments that need to be completed this Unit of study:

1. Reading assignment is McSpaden Chapter 4
2. Discussion Board 4.1
3. Your Mid Term exam is open from Friday 4/11 noon until Friday 4/18 at 6 p.m.

Again, I am so excited to be working with each of you and learning together in the course.

Happy Learning......