Title: Objectives
Course: 14SP-HIS-150-GWB2-HEAR. INSTRU. FITTING METHODS > Section: Lessons

Objectives for Unit 6

1. Physical reaction to acoustic stimuli
2. Objective nature of tympanometry measures
3. Effects of otitis media on child development
4. Neural reaction to acoustic stimuli
5. Objective nature of reflex measures
6. Tympanometry performance and nomenclature
7. The influence of middle ear impedance upon HI's
8. The use of reflexes in programming HI's

Please remember any questions you may have post them to the Q&A Discussion Board so that we all may learn together.  We are on the downhill side!

Have a great week!

Dr. Senay