Title: Summary of Learning and Completion of Unit 2
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

Hopefully we survived the first week, I understand there was a lot of material to cover.  Hang in there, I promise the material will get more manageable as the course progresses.  The material you are building are the building blocks that made a solid foundation for your future classes and labs. Below are tasks and assignments to review to assure you have completed your assignments.

Discussion Board 2.1 Discussion Student Moderator                                              Wed 1/22 11:59pm

Discussion Board 2.1 Discussion Student Moderator Response Posts                    Sunday 1/26 11:59 pm

Quiz 2.3                                                                                                                  Sunday 1/26   11:59pm

Proctor paperwork for Midterm and Final if applies to you  Monday 1/27