Title: HIS 125 Quiz 3.2
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Dropbox

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">When a bone conduction sound is presented, to determine which ear has the better cochlear response to that sound, you have performed a ___________.</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Pure tone test</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Weber test</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Discrimination test</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Rinne test</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Weber test</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Which audiometric testing evaluates cochlear function?</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Air conduction testing</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Bone conduction testing</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Weber testing</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Rinne testing</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Bone conduction testing</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">For accuracy and confidence in audiometric pure tone and speech testing results, there should be no more than a ____ decibel hearing level difference between the two tests.</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">One</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Five</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Ten</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Twenty</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Five</span></span>

Q: _______________ describes the ease which acoustic information is transmitted through the auditory system.
- Acoustic immittance
- Acoustic admittance
- Acoustic transmittance
- Acoustic impedance
A: Acoustic admittance

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">________________ is an objective means of assessing the integrity and function of the peripheral auditory system.</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Speech audiometry</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Pure tone audiometry</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Bone conduction audiometry</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Immittance audiometry</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Immittance audiometry</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Acoustic reflex measurement is a component of:</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Speech audiometry</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Pure tone audiometry</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Bone conduction audiometry</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Immittance audiometry</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Immittance audiometry</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">How many Jerger classifications are there in tympanometry?</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Three</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Four</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Five</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Six</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Five</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Which Jerger classification would best represent an intact eardrum with poor eustachian tube function?</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Type A</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Type B</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Type C</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">Type D</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">Type C</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">With immittance audiometry, high frequency probe tones are commonly used.</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">True</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">False</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">False</span></span>

Q: <span style="font-family:'Tahoma'"><span style="font-size:12pt">In immittance audiometry, which muscle contracts with sufficiently loud sound?</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">The stapedial muscle</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">The facial muscle</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">The radial muscle</span></span>
- <span style="font-family:'Tahoma'"><span style="font-size:12pt">The cranial muscle</span></span>
A: <span style="font-family:'Tahoma'"><span style="font-size:12pt">The stapedial muscle</span></span>