Title: Quick Check!
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

Review this checklist to make sure you haven't missed anything:

Unit 7 Activity | Action | Due Date (by 11:59pm) | Points
7.1: Unit 7 Discussion Forum | Post initial response by Thursday | February 27th | 10
 | Post peer responses by Sunday | March 2nd |
Required Reading | Hearing Disorders, Chapters 22 & 24 Unit 7 Lecture Materials |  |
7.2: Final Exam | Take your proctored final exam | February 28th-March 6th | 100