Title: Welcome
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

In Unit 4, we will discuss inner ear disorders, including ototoxicity, Meniere's disease, NIHL, congenital deafness, and presbycusis