Title: Welcome
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

In Unit 7, we will discuss the many aspects of aural rehabilitation.  Our learning will include amplification, implantable devices, and assistive technology.  We will also discuss the effects of hearing loss on speech/language and communication methods.