Title: Audiologic Assessment
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

Please view the attached powerpoint presentation, which corresponds to your reading for Chapter 4.  I am currently unable to embed my SlideShare presentation into BlackBoard; however, you may click here to be directed to the SlideShare site for viewing.

Attached Files: | - Audiologic Testing(1).pdf