Title: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS

Syllabus
  Course Syllabus
    Course Syllabus
  Proctoring FAQ's and Information-Important
Rubric
  Online Discussion Rubric
Lessons
  OTC_MoHEALTHWINs Grant License and Disclaimer for HIS 125 Blackboard Course
  Unit 1: The physiology of hearing
    Objectives for the Course
    Reading Assignment Unit 1
    Unit 1 Lecture Materials and Presentations
      The External Ear
      Sensitivity and Landmarks of the Outer Ear Presentation
    Summary of Learning and Completion of Unit 1
  Unit 2: Audiologic Testing Results
    Objectives
    Unit 2 Readings
    Unit 2 Lecture Materials and Presentations
      Audiology Online Presentation 21415 A New Look at Sensorineural Hearing Loss
      PowerPoints in PDF
        Auditory Sensitivity & Landmarks of the External Ear.pdf
        Electrical potentials, hair cells, and VIIIth nerve.pdf
        Functions of the Middle Ear Mechanisms.pdf
        The Otologic Evaluation.pdf
        Disorders of the outer ear overview.ppt.pdf
      Auditory Sensitivity and Landmarks of the External Ear
      Electrical Potentials, Hair Cells, and the Eighth Nerve
      Functions of the Middle Ear Mechanisms
      The Otologic Evaluation
      Disorders of the Outer Ear Overview
    Find Your Group
    Summary of Learning and Completion of Unit 2
  Unit 3: Medical Aspects of Hearing
    Objectives for Units 3 and 4
    Reading Assignment Unit 3
    Unit 3 Lecture Notes and Presentations
      PowerPoints in PDF for Unit 3
        Otologic Disease Overview.pdf
        Otitis Media & Otosclerosis.pdf
        Ototoxic Medications Overview.pdf
        Congenital Deafness & Medical Problems.pdf
        Hearing & the effects of Aging.pdf
        The Acoustic Tumor.pdf
        Medical Imaging--Overview.pdf
      The Otologic Disease Overview
      Otitis Media and Otosclerosis
      Ototoxic Medications Overview
      Congenital Deafness and Medical Problems
      Hearing and the Effects of Aging
      Medical Imaging Overview
      The Acoustic Tumor
    Midterm Review 1
    Midterm Review 2
    MIdterm Review 3
    Let's Review Unit 3
  Unit 4: Medical Aspects Continued
    Welcome
    Objectives
    Unit 4 Lecture Notes and Presentations
      Hawke Library
      Ototoxic Med
      Congenital Deafness
      Hearing and the effects of aging
      Acoustic Tumor
  Unit 5: Ototoxicity, NIHL, and Hearing Conservation
    Welcome!
    Objectives
    Unit 5 Lectures and Presentations
      Hearing Conservation
      Noise induced Hearing Loss
      Ototoxic Medications
    Unit 5 Reading Assignment
    Summary of Learning and Completion of Unit 5
  Unit 6: Vestibular Disorders and Tinnitus
    Welcome
    Objectives
    Unit 6 Lecture Materials and Presentations
      Tinnitus
      Vestibular Disorders
    Let's Review Unit 6
  Unit 7: Aural Rehabilitation: Hearing Aids, Implantable Devices, and Assistive Technology
    Welcome
    Objectives
    HIS 125 Proctoring Arrangement Form
    Unit 7 Lecture Materials and Presentations
      Fittings Options for Patient's with Single-Sided Deafness
    Unit 7 Presentations
    Unit 7 Optional Quiz
    Quick Check!
    Quick Check!
    Final Exam Review
      OTC's Proctoring FAQ's
      OTC's Understanding the Proctored Exam
      Unit 1 Lecture Materials and Presentations
        Anatomy of the Auditory System: A Review
      Unit 2 Lecture Materials and Presentations
        Interpretation of Tuning Fork Tests
        Audiologic Assessment
        Acoustic Immittance Measurements
      Unit 3 Lecture Materials and Presentations
        Unit 3 Review Powerpoint
        Medical Imaging Overview
        Otitis Media and Otosclerosis
        Otologic Disease Overview
        PowerPoints in PDF for Unit 3
          Otologic Disease Overview.pdf
          Otitis Media & Otosclerosis.pdf
          Medical Imaging--Overview.pdf
      Unit 4 Lecture Materials and Presentations
        Congenital Deafness and Medical Problems
        Hearing and the Effects of Aging
        The Acoustic Tumor
        Congenital Deafness & Medical Problems.pdf
        Hearing & the effects of Aging.pdf
        The Acoustic Tumor.pdf
      Unit 5 Lecture Materials and Presentations
        Ototoxic Medications Overview
        Noise-Induced Hearing Loss
        Hearing Conservation
      Unit 6 Lecture Materials and Presentations
        Vestibular Disorders
        Tinnitus
      Unit 7 Lecture Materials and Presentations
        Fittings Options for Patient's with Single-Sided Deafness
      Unit 7 Presentations
  Final Assessment Review
    OTC's Proctoring FAQ's
    OTC's Understanding the Proctored Exam
    Off Campus Proctoring Agreement
    Final Exam Review
      OTC's Proctoring FAQ's
      OTC's Understanding the Proctored Exam
      Unit 1 Lecture Materials and Presentations
        Anatomy of the Auditory System: A Review
      Unit 2 Lecture Materials and Presentations
        Interpretation of Tuning Fork Tests
        Audiologic Assessment
        Acoustic Immittance Measurements
      Unit 3 Lecture Materials and Presentations
        Unit 3 Review Powerpoint
        Medical Imaging Overview
        Otitis Media and Otosclerosis
        Otologic Disease Overview
        PowerPoints in PDF for Unit 3
          Otologic Disease Overview.pdf
          Otitis Media & Otosclerosis.pdf
          Medical Imaging--Overview.pdf
      Unit 4 Lecture Materials and Presentations
        Congenital Deafness and Medical Problems
        Hearing and the Effects of Aging
        The Acoustic Tumor
        Congenital Deafness & Medical Problems.pdf
        Hearing & the effects of Aging.pdf
        The Acoustic Tumor.pdf
      Unit 5 Lecture Materials and Presentations
        Ototoxic Medications Overview
        Noise-Induced Hearing Loss
        Hearing Conservation
      Unit 6 Lecture Materials and Presentations
        Vestibular Disorders
        Tinnitus
      Unit 7 Lecture Materials and Presentations
        Fittings Options for Patient's with Single-Sided Deafness
      Unit 7 Presentations
Dropbox
  1.2 Essay Questions Assignment
  HIS Quiz 2.3
  HIS 125 Quiz 3.2
  HIS 125 Mid-Term Exam
  HIS 125 Practice Test
  HIS 125 Quiz 5.2
  6.2: Unit 6 Quiz
  6.2 Otoscopy Assignment
  HIS 125 Final Exam
  Midterm questions
Resources
  James Madison University Cornell Note Taking
  OTC Online
  OTC Bookstore
  OTC Financial Aid
  Cochlear Fluid Lab Washington University
  Audiology Online Publication
  The Journal of Speech, Language and Hearing Research
  The Hearing Journal
  Proctoring FAQ's
  Off_Campus_Proctoring_Arrangement_Form.pdf
  Hearing Disorders by Jerry Northern
  Hawke Library
Help
Need Help?