Title: Let's Review Unit 6
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

Unit 6 Activity | Action | Due Date (by 11:59pm) | Points
6.1: Otoscopy Assignment | Follow instructions in Dropbox | February 23rd | 30
Required Reading | Hearing Disorders, Chapters 12, 18, 20, 23 Unit 6 Lecture Materials |  |
6.2: Quiz | Take a quiz related to Unit 6 concepts | February 23rd | 20
Discussion board |  | February 23rd. |