Title: Summary of Learning and Completion of Unit 5
Course: 14SP-HIS-125-GWA1-HEARING & AUDITORY DISORDERS > Section: Lessons

Unit 5 Activity | Action | Due Date (by 11:59pm) | Points
5.1: Unit 5 Discussion Forum | Post initial response by Thursday | February 13th | 10
 | Post peer responses by Sunday | February 16th |
Required Reading | Hearing Disorders, Chapters 11 & 13 Unit 5 Lecture Materials |  |
5.2: Quiz | Take a quiz related to Unit 4 & 5 concepts | February 16th | TBD