Title: Assignment: Fatigue Test equipment calibrate
Course: Advd Fluid Pwr & Servo Systems (EGT-152-1)(2016SP)

Using a linear position closed loop hydraulic servo, tune it to a specific frequency and displacement per the

specification given by the instructor.