Title: Assignment: SL19 Connect a linear position servo, with LVDT feedback
Course: Advd Fluid Pwr & Servo Systems (EGT-152-1)(2016SP)

Build and test a hydraulic linear positioning loop control to provide positioning speed and accuracy up to 20 Hz and +/- 2 microns repeatable positioning.