Title: Assignment 9
Course: WLD190 Online Test > Section: Assignment

Q: Are there any general notes found on drawing number 522923a0a
A: yes

Q: would the local scale be 1.500 or 1.00
A: 1.00

Q: what are the specification of the threads required on the 7/8 deep holes
A: 15/16-16

Q: how deep are the threads supposed to go on the 1/2 "deep holes
A: 1/4-20

Q: what tolerances (both plus and minus)apply to the 1.00 dimension
A: .005

Q: what tolerances (both plus and minus) apply to the 45-degree chamfer
A: 1/2 DEG

Q: What does UNC stand for
A: unified national coarse

Q: Is the height of the completed ball screw flange required to be 1 3/8 or 1.25
A: 1.25

Q: what thread specification is given for holes that are to be drilled with a #7 drill bit
A: Drill #7 x1/2dp tap 1/4-20unc x 3/8 dp