Title: Chapter 4 assignment 1
Course: WLD190 Online Test

Q: Why are the dimensions used on drawings?
A: gives size, location, orientation, form, or other characteristic information for the object shown

Q: define tolerance as described in this chapter
A: is the amount of variance from the dimension is shown that is acceptable

Q: what is baseline dimensioning
A: is a method of placing dimensions so that dimensions in a given direction for a particular part originate from a single baseline

Q: use the drawing to answer questions 4 through 10

What is the minimum and maximum acceptable size the 24 DEG endas of the part can be made?
A: 24.5 degrees

Q: How many holes are to be drilled in the bottom of the riser tube?
A: 4

Q: How far from the back edge of the part is the center line of the 5/16 diameter holes?
A: 1 1/4

Q: Name the orthographic projection views shown
A: front, top, right side, left side, bottom, and back

Q: What is the distance between the common center line of the holes on the bottom of the parts to the common centerline of the top of the part
A: 3/4"