Title: Quiz: SDS
Course: RSC_FST1200_CANVASCOURSE > Section: Week 5

Q: Your company uses so much FS Amine A that it has decided to buy the sanitizer by the drum. Maintenance is looking into how to store the drums and after reading the SDS sheet section _________, decides to store the drums in a concrete area with a small curb or dike to prevent leaks and spills from contacting the soil, surface,or ground water.
- Section 4. First Aid Measures
- Section 6. Accidental Release Measures
- Section 7. Handling and Storage
- Section 11. Toxicological Information
A: Section 6. Accidental Release Measures

Q: You are training a worker how to use Zep ProVisions No-Rinse Sanitizer to finish cleaning her area. The GHS Hazard Pictogram is

What will you tell her about the proper equipment to wear while diluting and using this sanitizer?
- You will help her find Section 2. Hazards Identification on the chemical SDS sheet and use the protective wear suggested there.
- Find the SSOP for the equipment and use the protective gear suggested there.
- gloves and safety glasses
- You are going to dilute it. She won't need the protective gear then.
A: Find the SSOP for the equipment and use the protective gear suggested there.

Q: The GHS pictogram

just means that these chemicals are less dangerous and can't kill you.
- True
- False
A: False

Q: You are given the task of deciding where to store drums of Zep FS Neutral Cleaner Pump. What do you recommend?

Use the SDS sheet to support your recommendations.

Q: When a person needs to know the recommended use of a chemical, they need to look in ______________ portion of the chemical's SDS.
- Section 16: Other Information
- Section 9: Physical and Chemical Properties
- Section 3: Composition/Information of Ingredients
- Section 1: Identification
A: Section 1: Identification

Q: Zep FS Amine A has the Hazard pictograms

and .

Zep Provisions No-Rinse Sanitizer only has the pictogram

. What makes the FS Amine A more dangerous to a person's health than the No-Rinse Sanitizer?
- When Section 12: Ecological Information is examined, FS Amine A is toxic to aquatic organisms.
- When Section 3. Compositon/Information on Ingredients is checked, FS Amine A has propan-2-ol listed as an ingredient.
- When Section 11: Toxicological Information is examined, the Acute Oral Toxicity of FS Amine A makes it more dangerous than the sanitizer.Or if Section 2. Hazards Identification is checked, FS Amine A has more GS Hazard Classifications than the sanitizer.
- In section 9. Physical and chemical properties, the viscosity of the No-Rinse Sanitizer is 4.7 mm^2/s and FS Amine A's is 4.9 mm^2/s.
A: When Section 11: Toxicological Information is examined, the Acute Oral Toxicity of FS Amine A makes it more dangerous than the sanitizer.Or if Section 2. Hazards Identification is checked, FS Amine A has more GS Hazard Classifications than the sanitizer.

Q: is the GHS pictogram that warns of ____________ Hazards.
A: Health

Q: Where do you look on an SDS to find information about where and how the chemical should be used?
- Section 3. Composition and Information on Ingredients
- Section 9. Physical and Chemical Properties
- Section 16. Other Information
- Section 1. Product and Company Information
A: Section 1. Product and Company Information

Q: Someone in your company has been injured by Zep FS Neutral Cleaner Pump. When you look in Section 3. Composition/Information on Ingredients, you discover that the exact percentages of disclosed substances are withheld as trade secrets. What do you do next?

Q: Which GHS pictogram warns of chemicals that can do ecological damage?
A: (a choice with no text)

Q: While looking at Section 7. Handling and Storage of the SDS for ZEP FS Neutral Cleaner Pump, you notice the materials to avoid section. What two GHS pictograms are you going to look for when you go to store this chemical so that you avoid storing incompatible chemicals together?
- and
- and
- and
- and
A: and