Title: Assignment: Lab 3 - Environmental Testing
Course: RSC_FST1200_CANVASCOURSE

This lab walks a student through the mechanics of environmental testing using 3M Petrifilm plating technique. We will be using information from all four of the documents below. Start with reading the word document

Environmental Monitoring using 3M Quick Swab.docx

Quick Swab use instructions.pdf

3M E Coli-Coliform Plate instructions.pdf

3M Petrifilm eCOLI INTERPRETATION GUIDE.pdf