Title: Lab Assignment: CHARM Testing for SSOP Verification
Course: RSC_FST1200_CANVASCOURSE > Section: Week 3

Download and complete the Sanitation Monitoring using CHARM lab. This lab will explore the use of the ATP method of sanitation verification, it's positive aspects and drawbacks.