Title: WISE Grant MFGT 156 Cert, Qulty Inspctr Prep

Week 1 Module
  Week 1 Reading Assignment
  Week 1 Quality Article Assignment
  Week 1 Other Assignment
  Week 1 Participation
  Technical Mathematics - Basic Shop Math - 1
  Technical Mathematics - Basic Shop Math - 2
  Technical Mathematics - Basic Shop Math - 3
  Technical Mathematics - Basic Algebra - 1
  Technical Mathematics - Basic Algebra - 2
  Technical Mathematics - Basic Geometry
  Technical Mathematics - Basic Trigonometry
  Technical Mathematics - Measurement Systems
  Technical Mathematics - Numeric Conversions
Week 2 Module
  Week 2 Reading Assignment
  Week 2 Quality Article Assignment
  Week 2 Participation
  Metrology - Common Gauges and Measurement Instrument
  Metrology - Special Gauges and Applications
  Metrology - Gauge Selection, Handling, and Use
Week 3 Module
  Week 3 Reading Assignment
  Week 3 Quality Article Assignment
  Week 3 Participation
  Metrology - Surface Plate Tools and Technique
  Metrology - Specialized Inspection Equipment
Week 4 Module
  Week 4 Reading Assignment
  Week 4 Quality Article Assignment
  Week 4 Participation
  Metrology - Calibration
  Metrology - Measurement System Analysis
Week 5 Module
  Week 5 Reading Assignment
  Week 5 Quality Article Assignment
  Week 5 Participation
  Inspection and Test - Blueprints, Drawings, Geometric Dimensioning & Tolerancing (GD&T)
  Inspection and Test - Sampling
Week 6 Module
  Week 6 Reading Assignment
  Week 6 Quality Article Assignment
  Week 6 Participation
  Inspection and Test - Inspection Planning and Processes
  Inspection and Test - Testing Methods
  Inspection and Test - Software for Test Equipment
Week 7 Module
  Week 7 Reading Assignment
  Week 7 Quality Article Assignment
  Week 7 Participation
  Quality Assurance - Basic Statistics and Applications - 1
  Quality Assurance - Basic Statistics and Applications - 2
  Quality Assurance - Statistical Process Control (SPC) - 1
  Quality Assurance - Statistical Process Control (SPC) - 2
Week 8 Module
  Week 8 Reading Assignment
  Week 8 Quality Article Assignment
  Week 8 Final Paper/Presentation
  Week 8 Participation
  Quality Assurance - Quality Improvement
  Quality Assurance - Quality Audit
  Quality Assurance - Quality Tools and Technique
Week 9 Module
  Week 9 Reading Assignment
  Week 9 Quality Article Assignment
  Week 9 Other Assignment
  Week 9 Participation
  Quality Assurance - Problem-solving Tools and Continuous Improvement Technique
  Quality Assurance - Resources
Week 10 Module
  Week 10 Reading Assignment
  Week 10 Quality Article Assignment
  Week 10 Other Assignment
  Week 10 Participation
Geo Tol Pro
Final Examination
  Final Examination