Title: Week 10 Reading Assignment
Course: WISE Grant MFGT 156 Cert, Qulty Inspctr Prep > Section: Week 10 Module

Review Chapters 1 through 25 in The Certified Quality Inspector Handbook, 2nd Edition

Review Pages 103 through 121 in The Ultimate GD&T Pocket Guide, 2nd Edition