Title: Week 5 Reading Assignment
Course: WISE Grant MFGT 156 Cert, Qulty Inspctr Prep > Section: Week 5 Module

Read Chapters 14-15 in The Certified Quality Inspector Handbook, 2nd Edition

Review Pages 59 through 66 in The Ultimate GD&T Pocket Guide, 2nd Edition