Title: Week 2 Reading Assignment
Course: WISE Grant MFGT 156 Cert, Qulty Inspctr Prep > Section: Week 2 Module

Read Chapters 7-9 in The Certified Quality Inspector Handbook, 2nd Edition

Review Pages 6 through 20 in The Ultimate GD&T Pocket Guide, 2nd Edition

Also, read the Wikipedia article about Quality Assurance ... https://en.wikipedia.org/wiki/Quality_assurance