Title: Week 4 Reading Assignment
Course: WISE Grant MFGT 156 Cert, Qulty Inspctr Prep > Section: Week 4 Module

Read Chapters 12-13 in The Certified Quality Inspector Handbook, 2nd Edition

Review Pages 53 through 58 in The Ultimate GD&T Pocket Guide, 2nd Edition