Title: MC_AGRI1380_RfWildhirt_NM06122017

AGRI 1380 GPS, Sensors and Controls
  Brochure for Student Success Center
  N-PACE Intake form:
  Course Syllabus 17/SP
  Course Announcements
Introduction
Identify the components and usage of global position system (GPS) equipment
  GPS.gov AGRICULTURE
  How GPS works poster
  VIDEO: Drones Poised to Elevate Agricultural Efficiency (7:15)
  Precision Agriculture: Global Positioning System (GPS)
  VIDEO: How to read longitude & latitude (4:48)
  Precision Farming Tools: Global Positioning System (GPS)
Evaluate differential correction, expected accuracy and data transfer from GPS
  VIDEO: Latitude Longitude Lesson (14:37)
  VIDEO: Global Positioning System (GPS) Fundamentals: A Video Lecture (13:25)
  Trimble GPS Tutorial - How Differential GPS works
  Trimble GPS Tutorial - Where to get Differential Corrections
  Precision Agriculture Eats Data, CPU Cycles: It's A Perfect Fit For Cloud Services
  VIDEO: Realizing the Promise of Data-Driven Precision Agriculture (2:07)
Differentiate among terrain and soil sensing systmes for various soil and moisture characteristices
  Soil Health Assessment
  CropMetrics: Optimum Probe Location
  VIDEO: Farm Basics - Till Vs No-Till #718 (Air Date 1/8/11) (4:49)
  VIDEO: A profitable system (3:52)
  Precision Planting technologies
  VIDEO: Farm Basics #885 - Variable Rate Planting (Air Date 3/22/15) (4:43)
Analyze Variable rate sensors in precision agriculture
  Precision Farming Tools: Variable-Rate Application
  Implementing Site-Specific Management: Map- Versus Sensor-Based Variable Rate Application
  Basics of Automatic Section Control for Agricultural Sprayers
  Trimble Ag Field Solutions: Field and Application Control
  Crop Sensor Components presentation
  VIDEO: Variable Rate Technology (31:00)
  VIDEO: Variable Rate Planter Video (1:42)
  Farm Basics: Variable Rate Planting (From Ag PhD #545) (4:13)
  NORAC
  VIDEO: NORAC Spray Height Control (6:16)
Investigate agriculture irrigation soil moisture probes
  CropMetrics: Optimum Probe Location
  Site Specific Soil Soil Moisture Monitoring with Irrigate.net presentation
  Measuring Soil Water Content
  VIDEO: Using soil moisture probes to make better farming decisions (3:45)
Summarize harvest automation's functionality
  VIDEO: John Deere Combine Go Harvest: Yield Calibration Procedure (7:58)
  S-series Combine Calibration Guide
  Yield Monitor Calibration Tips
  VIDEO: Grain Header Height Control (1:49)
  VIDEO: John Deere Combine GoHarvest: HarvestSmart (5:03)
  Six Steps to Calibrate Combine Yield Monitors
  VIDEO: New Holland CR Tier4A Combine Moisture Sensor (1:12)
  John Deere FarmSight™
  Yield Monitor Calibration: Garbage In, Garbage Out
Examine ISOBUS/CANBUS functions
  How to Use a Multimeter (10:32 video included)
  ISOBUS
  ISOBUS Training presentation
  Electrical, CAN bus electrical system
  CAN bus at your control
  Controller Area Network (CAN) Bus J1939 Data Acquisition Methods and Parameter Accuracy Assessment Using Nebraska Tractor Test Laboratory Data
Project Test
  Project Test
Explore the Usage of UAV Technology as associated with sensors
  MIT Technology Review: Agricultural Drones
  Agriculture Drones Are Finally Cleared for Takeoff
  The pros and cons of drones
  Measuring Vegetation (NDVI and EVI)
  Normalized Difference Vegetation Index (NDVI)
  Investigating the Potential for Drone Use in Agriculture
Identify legal considerations when interpreting GPS data usage
  Internet of Things and Big Data raise big legal issues
  How Big Data And Tech Will Improve Agriculture, From Farm To Table
  Big Data in Agriculture: Legal Issues
  The ethics of big data in big agriculture
  VIDEO: Legal Issues Associated with "Drones" and Big Data in Agriculture - An Ag Law Webinar (59:35)