Title: Canvas Practice Course

Getting Started
  About this course - you MUST read and acknowledge.
  Getting Started (Mandatory Student Forms)
  AC113 Syllabus Quiz
  Department of Labor
Chapter 18 Troubleshooting Modern HVAC Control Circuitry and Systems
  Understanding HVAC Schematic Videos
  Placeholder for copyright material-2
  Placeholder for copyright material-2