Title: Lecture Materials: Chapter 3 - The Medical Assisting Profession
Course: SkillsCom CMA 200 15.0

1. Complete the following lesson at this link: Lesson 1: The Role of the Medical Assistant in the Medical Office. (eText)

2. Complete the following lesson at this link: Lesson 2: Medical Assisting Training and Credentials. (eText)

3. Complete the following lesson at this link: Lesson 3: Professionalism. (eText)

4. Complete the following lesson at this link: Lesson 4: Lifelong Learning. (eText)