Title: Activity: (U2 M2) What Do You Know?
Course: SkillsCom CMA 200 15.0 > Section: Unit 2 Module 2

Based on what you have now learned, describe how the HITECH Act impacts the medical provider and whether you think it will make a difference combating the high cost of health care.