Title: Units Conversion Quiz
Course: EIT233QMWeek1Module > Section: Week 1 Module

Q: 12 in /1 ft = 1
- True
- False
A: True

Q: Rules of algebra don't apply to units since they are not numbers.
- True
- False
A: False

Q: one cubic foot has a volume of 144 in^3
- True
- False
A: False

Q: Units tell a story of what is being measured.
- True
- False
A: True

Q: 0.22 mA is equal to the test current for a Fluke 789 measuring a low resistance.  The current can also be written as ____.
- 0.022 A
- 0.0022 A
- 220 uA
- Both B and C
A: 220 uA

Q: Liquid flows from a 4" ID pipe with an average velocity of 3 feet per second.  This flow is equivalent to ___ gallons per minute (GPM).

Hint: Watch the units video for info on how to solve this.  Also you should find that the cross-section of the pipe is 12.56 in^2
- 400 gpm
- 1.95 gpm
- 117.5 gpm
- 97.6 gpm
A: 117.5 gpm