Title: Excel 9 - Corn Plot Final
Course: MASTER-AGRI-1369-WB-Malone > Section: Excel Spreadsheet Agricultural Applications

For this exercise students will use many of the Excel functions used in previous lessons. Students will calculate the gross income for each hybrid, the cost of seed for 160 acres, and the difference in income when figuring seed expense for each hybrid, along with analyzing which hybrid is the best and worst performer.

Instructions:

Download these files: Assignment Corn Plot Final and Corn Plot Final.xlsx

Students are to complete the spreadsheet provided; calculate and analysis each brand of seed for performance.  Be sure to enter dollar signs where needed.

After completion upload the file to this assignment by clicking on the title, select Add Submission, drag and drop your file into the box or select your file to upload and press save changes.

This assignment has a point value of 20 points.