Title: Reading: (CU1 M1) Chapter 18 Obstetrics
Course: SkillsCom CMA 103 14.0 > Section: Credit Unit 1 Module 1

Reading Chapter 18 (eText) in Comprehensive Medical Terminology by Betty Davis Jones will help to understand obstetrics.

You are not required to complete the chapter review exercises at the end of the chapter, however, they are an excellent way to determine your mastery of the Reading.

As an alternative, this PowerPoint presentation outlines the SAME material that is contained within the book.