Title: Reading: (CU2 M2) Chapter 5 The Integumentary System
Course: SkillsCom CMA 101 15.0 > Section: Credit Unit 2 Module 2

As you read Chapter 5 - The Integumentary System (eText) in Comprehensive Medical Terminology by Betty Davis Jones, you will learn more vocabulary, their definitions, and the part they play in the human body. You are not required to complete the chapter review exercises at the end of the chapter, however, they are an excellent way to determine your mastery of the Reading.

As an alternative, this PowerPoint presentation outlines the SAME material that is contained within the book.