Title: Module 3 Introduction: (CU1 M3) Suffixes
Course: SkillsCom CMA 101 15.0 > Section: Credit Unit 1 Module 3

Let's continue to build your medical terminology vocabulary by discussing suffixes.

The goal of this Module is for you to learn the definitions of suffixes so that when you see an unfamiliar medical terminology, it will be easier for you to determine the meaning and the context based on the meaning of the suffixes.

Course Outcomes:

- Diagram medical terms, labeling the word parts.
- Define both medical terms and abbreviations related to all body systems.