Title: Discussion: My Job
Course: MASTER-GIST-1900/1901-Patton > Section: Week Five

Let your classmates know what you are doing at your internship/coop.  What are some things your have learned?  What are your likes and dislikes to this point?

Select: Add new discussion topic,

Title the discussion: My Job

Select: Post to forum

The discussion board forums are an opportunity to have thoughtful discussions about the projects.

Please post your initial response by the due date listed in the Course Calendar. Your post is due by Wednesday at 11:55 p.m.  You must respond to another classmate's post by Sunday at 11:55 p.m.

This discussion is worth 20 points.

Grading Rubric for Discussions