Title: MASTER-AGRI-1172-HB-2017-Malone

0
  This course is arranged in chronological order. W...
  Welcome Message
  Instructor Contact Information & Online Availability
  News forum
Introductory Materials & Activities
  Readings and Resources
    Syllabus
    Course Policies
    Course Calendar
    Technical Help & Server Maintenance Information
    Introduction to AGRI 1172 HB
  AssignmentsPlease complete the activities below.&n...
    Intro Discussion – Introduce yourself to classmates
    Intro Quiz
Basic Hardware Fundamentals
  Readings and Resources
    Unit 1 Outline
    Syllabus
  New AgTalk
  Precision Capabilities/Basic Hardware
  Precision Hardware Anatomy
  Why would you yield map?
  Can-Bus vs. Isobus
    Fundamental of electricity
  Connectors
    Multimeters
  Assignments Please complete the activities below.&...
    Discussion 1 - Precision Control Application
GPS and Auto Steer
  Readings and Resources
  Unit 2 Outline
  Syllabus
  GPS system and principles powerpoint
  GPS Principles video
  RTK Video
  Auto Steer powerpoint
  Iron Talk on Auto Steer
  Hydraulic Auto Steer components
  TCM Calibration
  Assignments Please complete the activities below.&...
  Discussion 2 - Auto Steer
  GPS and Auto Steer
Planting
  Readings and Resources
  Unit 4 Outline
  Syllabus
  planting ppt
  VDrive video
  Kinze's elctrice drive and newest meter
  John Deere's Exact Emerge
  Kinze's Multi Hybrid planting
  Precision Planting Multi Hybrid system
  Analog seed tube sensors
  Seed tube sensors
  John Deere on DownForce margin
  Ag Leader's Hydraulic downforce
  Assignments Please complete the activities below.&...
  Discussion 4 - Future Trends in Planting
  Planting
Course Evaluation
Application
  Readings and Resources
  Unit 3 Outline
  Syllabus
  Fertilizer and application ppt
  NH3 video
  Air Fertilizer application
  Spinner Spreader application
  Assignments Please complete the activities below.&...
  Discussion 3 - Application of chemicals and feritilzer
  Fertilizer and Chemical application
Yield monitoring and mapping
  Readings and Resources
  Unit 5 Outline
  Syllabus
  Yield mapping and monitor ppt
  Photoelectric yield monitoring
  Elevator moisture unit
  Flow or Impact yield sensor
  Assignments Please complete the activities below.&...
  Discussion 5 - Field Imaging
  Yield monitoring and mapping
8
9
10