Title: Module 1 Introduction: (CU1 M1)
Course: SkillsCom BA 177 16.0 > Section: Credit Unit 1 Module 1

Module 1 introduces the need for payroll and personnel records.

Module Outcomes:

- Describe how the Federal Insurance Contributions Act (FICA) is applied by employers.