Title: Reading: (CU2 M1) Chapter 1, Section 1.1 & 1.2
Course: SkillsCom BA 101 16.0 > Section: Credit Unit 2 Module 1

Read Section 1.1 & 1.2 |

Note:  If you have not already purchased your eText, please follow these directions:

eText:  You will need to purchase your eText entitled "Exploring Business, v. 2.0" (Webpage) by Karen Collins. Once you click the link, it will take you to the page where you can choose which format which format to purchase. You can choose either Study Pass or Digital All Access Pass. Follow the directions on the screen.