Title: Chapter 5 Supporting the Power System, Troubleshooting Computers
Course: DEPT MC - PERSONAL COMPUTER HARDWARE > Section: Module 2 (Chapter 5, 6, 9, 19)

Learning Objectives

- Describe the methods and devices for keeping a system cool
- Select a power supply to meet the power needs of a system
- Demonstrate an organized approach to solving any computer problem
- Troubleshoot problems with the electrical system
- Troubleshoot problems with the motherboard, processor and RAM
- Troubleshoot problems with mobile devices

1. Read Chapter 5 Supporting the Power System and Troubleshooting Computers
2. Review the Chapter PowerPoint Presentation
3. Review TestOut Components 3.14
4. Complete the TestOut Lab Activities, upload scores to assignment dropbox:
  1. 3.4.3 Troubleshoot System Power
  2. 3.4.4 Troubleshoot Power Supply Problems
5. Take the Chapter Review Quiz

Click the " Next " button (bottom-right) to complete the following:

- TestOut Lab Screenshot  Dropbox
- Chapter Review Quiz