Title: Chapter 13, Troubleshooting Hardware Problems
Course: DEPT MC - PERSONAL COMPUTER HARDWARE

Learning Objectives

- Investigate an devaluate operational procedures to keep you, other people, the equipment, and the environment safe (CO 1)
- Develop a preventative maintenance plan (CO 3)
- Practice troubleshooting - How to approach & solve PC problems (CO 2)

1. Read Chapter 13
2. Review the Chapter PowerPoint  Presentation
3. Complete the following TestOut Components 2.1, 2.5, 13.1, 13.2, 13.3, 13.4, 13.5
4. Complete the TestOut Lab Activities:

- 13.2 Lab/Activity, Troubleshoot Floppy Configuration, Troubleshoot PATA Devices;
- 13.5 Lab/Activity, Configure the Boot Order, Troubleshoot the Boot Order;
- 13.1 Lab/Activity, Troubleshoot System Power, Troubleshoot Power Supply Problems, Troubleshoot Processor Installation 1, Troubleshoot Processor Installation 2, Troubleshoot Memory 1, Troubleshoot Memory 2,
- 13.11 Lab/Activity, Manage Devices 1, Manage Devices 2

5.  Take the Chapter Review Quiz

Watch this video:

Britec09 (2015, October 4). Manually Test a (PSU) Power Supply With a Multimeter by Britec [Video file]. Retrieved from https://youtu.be/ac7YMUcMjbw |

Click the " Next " button (bottom-right) to complete the following:

- Lab Dropbox
- Chapter Review Quiz