Title: Lesson 16: Reading and Study Guide Exercise
Course: RITA MC - ITNW 1354 > Section: Lesson 16: Configuring Domain Controllers

In this assignment you will read Lesson 16 Configuring Domain Controllers and view the PowerPoint presentation. Once you finish you will review the supplemental video(s) to help with the end of chapter questions.

70-411 R2 Lecture Slides Lesson 16.pptx