Title: Web Hosting
Course: WILLIS MC - ITNW1313

Module Goals:

Type 1 or "Bare Metal" hyper-visors allow high reliability were multiple hardware failure do not significantly effect the availability of web resources. We will deploy high reliability network storage assets.

Module Objectives:

- Add web hosting to the VM for your created business. [CO1,2]
- Demonstrate awareness of elements required to expand VM. [CO2,4]

Software:

ESXI, VSphere

Resources:

Introduction to Website Administration

Link

Desktop virtualization with Apache VCL

Link

How to Configure Apache Web Server on Linux

Link

How to Install Apache, MySQL, and PHP: Linux Server Training 101

Link

How To Install Linux, Apache, MySQL, PHP (LAMP) stack on Ubuntu 14.04 in AWS

Link