Title: Course Materials
Course: WILLIS MC - ITNW1313 > Section: Start Here

Course Books, Software and other materials

Required:

Internet access

Recommended Textbook:

Virtualization Essentials by Matthew Portnoy.

Published by Sybex/Wiley; ISBN 978-1118176719.

Recommended Tools:

8Gb memory stick / USB thumb drive (Optional)

The following programs will be provided:

Virtual Box, VMWare, ESXI / VSphere, pFSense, Apache Web server.