Title: Virtual Enterprise
Course: WILLIS MC - ITNW1313 > Section: 10 Virtual Enterprise

Module Goals:

In this lab you will build a data center on your computer.

Module Objectives:

Create a fictional business.

Demonstrate understanding of all aspects required to support industry. [CO4]

Create and deploy VMs necessary to handle the needs of the created business. [CO2,4]

Software:

ESXI, VSphere

Resources:

Build your own VMware vSphere ESXi 5.5 Datacenter, starting with one PC

Link