Title: Test 1
Course: WILLIS MC - ITNW1313 > Section: 4 VMDK, VDI, OVA

Q: A virtual machine has no IP address.
- True
- False
A: False

Q: Virtual box is available on: Mac OSx, Most version of Linux, and nearly all versions of Windows.
- True
- False
A: True

Q: Home users usually use type 2 hyper visors.
- True
- False
A: True

Q: Large enterprise business usually employ type 1 hypervisors on a server to support the largest number of Virtual Machines,
- True
- False
A: True

Q: The following are examples of fully function SYSTEM virtual machine managers.
- A) Virtual Box
- B) VM Ware Workstation
- C) DosBox
- D) All of the above
- E) Just A and B
A: E) Just A and B