Title: Type 1 Introduction
Course: WILLIS MC - ITNW1313 > Section: 8 Type 1 Hypervisors & vSphere

Lab Assignment

SETUP Type 1 Hypervisor

- Set up a type 1 "bare metal" hypervisor.
- You can do this on a spare class server, as a nested VM, or in an online environment (your choice).
- Deploy remote management tools.
- Show the installation of at least 2 VMs in their environment.
- Show scheduling, resource management, and load management.
- Explain in 1 to 2 pages the advantages of type 1 hypervisors for business. Be specific.

Grading:

Send me a Power Point or PDF file showing your name, the lab number, the objective, a sufficient description, and screen shots to show me you completed this exercise.