Title: Data Protection & Fault Tolerance
Course: WILLIS MC - ITNW1313 > Section: 15 Data Protection & Fault Tolerance

Module Goals:

Type 1 or "Bare Metal" hyper-visors are the backbone of commerce and most online applications, they use virtualized storage and application clustering to ensure high reliability and availability.  This lab will examine how to deploy these.

Module Objectives:

- Install and test components within VM. [CO1,2]

Software:

ESXI, VSphere

Resources:

Primary Data - What is Data Virtualization?

Link

VMware vSphere 6.0 and VSAN 6

Link

Data Virtualization Day 2012: Presentation From David Besemer of Composite Software

Link

VMWARE ESXI Storage 1 Fiber Channel

Link

Create Raid 5 on VMWare workstation

Link

Adding Hard Drives and Creating Volumes in Windows Server 2012

Link