Title: Lesson 1: Lab
Course: RITA MC - ITNW 1308 > Section: Lesson 1: Evaluating Hardware Readiness and Capability

In this lab you will follow the lab instructions for Lab 1 from the MOAC 70-687. Your lab will be to Evaluate hardware readiness and compatibility. Choose between an upgrade and a clean installation; determine which SKU to use, including Windows RT; determine requirements for particular features, including Hyper-V, Miracast display, pervasive device encryption, virtual smart cards, and Secure Boot.

70-687 8.1 MLO Worksheet Lab 01.docx

You will use the following naming convention to upload your answers via canvas: Lesson_1_Lab_1_FN_LN where FN is your First name and LN is your Lastname.