Title: Lesson 1: Reading and Study Guide Exercise 1
Course: RITA MC - ITNW 1308 > Section: Lesson 1: Evaluating Hardware Readiness and Capability

In this assignment you will read Lesson 1 - Evaluating Hardware Readiness and Capability and view the PowerPoint presentation. Once you finish you will review the supplemental video(s) to help with the end of chapter questions.

MOAC 70-687 L01.CE.pptx