Title: Three Phase Power
Course: 2016FA-MCO-110-401 > Section: Module 3: Power

Three phase power is often utilized in critical facilities in order to deliver more reliable, higher voltages. This presentation introduces power phases, three phase power, types of three phase generation, and the benefits of using different systems.

Objectives met:
- C3
- 3.4