Title: References
Course: 2016FA-MCO-110-401 > Section: Module 4: Facilities Maintenance and HVAC

References
Reference Number | Reference Information
[1] | D. Sapp, "Facilities Operation and Maintenance," 23 October 2014. [Online]. Available: https://www.wbdg.org/om/om.php. [Accessed 17 August 2015].
[2] | L. Robin, "Slick tricks in oil analysis," 15 August 2006. [Online]. Available: http://www.plantservices.com/articles/2006/212/. [Accessed 18 August 2015].
[3] | S. Kennedy, "New Tools for PdM," 15 March 2006. [Online]. Available: http://www.plantservices.com/articles/2006/072/. [Accessed 18 August 2015].
[4] | C. Yung, "Vibration analysis: what does it mean?," 9 June 2006. [Online]. Available: http://www.plantservices.com/articles/2006/154/. [Accessed 18 August 2015].
[5] | Cadick Corporation, "Reliability Centered Maintenance White Paper," [Online]. Available: http://www.mainsaver.com/pdf/Reliability_Centered_Maintenance_White_Paper.pdf. [Accessed 18 August 2015].
[6] | P. M. Curtis, Maintaining Mission Critical Systems in a 24/7 Environment, 2nd ed., Hoboken, New Jersey: John Wiley & Sons, 2011.
[7] | Business Dictionary.com, "work order," 2015. [Online]. Available: http://www.businessdictionary.com/definition/work-order.html. [Accessed 26 August 2015].
[8] | D. Sapp, "Computerized Maintenance Management Systems (CMMS)," 23 October 2014. [Online]. Available: https://www.wbdg.org/om/cmms.php. [Accessed 17 August 2015].
[9] | J. Kotter, "Change Management vs. Change Leadership -- What's the Difference?," 12 July 2011. [Online]. Available: http://www.forbes.com/sites/johnkotter/2011/07/12/change-management-vs-change-leadership-whats-the-difference/. [Accessed 26 August 2015].
[10] | Data Center Talk Sue, "Data Center HVAC Systems," 17 November 2011. [Online]. Available: http://www.datacentertalk.com/2011/11/data-center-hvac-systems/. [Accessed 27 August 2015].
[11] | R. Rosenberger, "Chillin' in the Data Center: An Overview of Cooling Towers," 22 October 2014. [Online]. Available: http://www.datacenterjournal.com/chillin-data-center-overview-cooling-towers/. [Accessed 20 August 2015].
[12] | ASHRAE, "ashrae.org," [Online]. Available: https://www.ashrae.org/about-ashrae. [Accessed 20 August 2015].
[13] | Cooling Technology Institute, "What is a (wet, atmospheric) cooling tower?," 2015. [Online]. Available: http://www.cti.org/whatis/coolingtower.shtml. [Accessed 18 August 2015].
[14] | M. S. U. Mankato, "Cooling Tower," [Online]. Available: http://cset.mnsu.edu/engagethermo/components_coolingtower.html. [Accessed 18 August 2015].
[15] | Baltimore Aircoil Company, "Closed Circuit Cooling Towers," 2010. [Online]. Available: http://www.baltimoreaircoil.com/english/products/closed-circuit-cooling-towers. [Accessed 19 August 2015].
[16] | Alliance for Water Efficiency, "Introduction to Cooling Towers," 2010. [Online]. Available: http://www.allianceforwaterefficiency.org/cooling_tower_intro.aspx. [Accessed 26 August 2015].
[17] | H. Khemani, "Direct Expansion (DX) Type of Central Air Conditioning Plant or System," 25 September 2009. [Online]. Available: http://www.brighthubengineering.com/hvac/50158-direct-expansion-dx-type-of-central-air-conditioning-plant-or-system/. [Accessed 26 August 2015].
[18] | R. Yeh, "Compression Refrigeration System," [Online]. Available: http://web.mit.edu/2.972/www/reports/compression_refrigeration_system/compression_refrigeration_system.html. [Accessed 26 August 2015].
[19] | S. O'Donnell, "Architectural Aesthetics can Minimize Cooling Efficiency," 14 July 2008. [Online]. Available: http://www.thehotaisle.com/2008/07/14/architectural-aesthetics-can-minimize-cooling-efficiency/. [Accessed 20 August 2015].
[20] | V. C. Thomas, "Chiller Plant Design," 2013. [Online]. Available: http://energy-models.com/chiller-plant-design. [Accessed 21 August 2015].
[21] | Georgia Power, "Equipment," 2015. [Online]. Available: http://business.georgiapower.com/tools/hvac-systems/economizers-hvac/water-side-vs-air-side-economizer-system/. [Accessed 26 August 2015].
[22] | Devatech Engineers Private Limited, "Industrial Wheel," [Online]. Available: http://www.indiamart.com/devatech-engineering/industrial-wheels.html. [Accessed 26 August 2015].
[23] | D. Mascola, "CRAC vs CRAH," 11 August 2011. [Online]. Available: http://www.dchuddle.com/2011/crac-v-crah/. [Accessed 26 August 2015].
[24] | J. Niemann, K. Brown and V. Avelar, "Hot-Aisle vs. Cold-Aisle Containment for Data Centers: White Paper," Schneider Electric, 2010. [Online]. Available: http://www.missioncriticalmagazine.com/ext/resources/MC/Home/Files/PDFs/WP-APC-Hot_vs_Cold_Aisle.pdf. [Accessed 27 August 2015].
[25] | 42U.com, "In-Row Cooling for Server Rooms & Data Centers," 2015. [Online]. Available: http://www.42u.com/cooling/in-row-cooling.htm. [Accessed 28 August 2015].
[26] | R. Flake, "Practical Standards to Measure HVAC System Performance," 1 April 2006. [Online]. Available: http://contractingbusiness.com/archive/practical-standards-measure-hvac-system-performance. [Accessed 27 August 2015].
[27] | American Standard, "Glossary of HVAC Terminology," 2013. [Online]. Available: http://www.americanstandardair.com/resources/glossary.html#glossaryD. [Accessed 27 August 2015].
[28] | InspectApedia.com, "Free Encyclopedia of Building & Environmental Inspection, Testing, Diagnosis, Repair," 2015. [Online]. Available: http://inspectapedia.com/Energy/Dew_Point_Tables.php. [Accessed 27 August 2015].
[29] | InspectApedia.com, "Electrical Definitions: Amps, Volts, Watts, Ground," 2015. [Online]. Available: http://inspectapedia.com/electric/Electrical_Definitions.php#Watts. [Accessed 27 August 2015].
[30] | Dictionary.com, "dictionary.reference.com," Random House, Inc., 2015. [Online]. Available: http://dictionary.reference.com/browse/setpoint. [Accessed 27 August 2015].
[31] | study.com, "Pressure: Defintion, Units, and Conversions," 2015. [Online]. Available: http://study.com/academy/lesson/pressure-and-temperature-conversions.html. [Accessed 28 August 2015].
[32] | Achrnews.com, "The need for head pressure control," 1 June 2000. [Online]. Available: http://www.achrnews.com/articles/98377-the-need-for-head-pressure-control. [Accessed 28 August 2015].
[33] | Houghton Mifflin Harcourt Publishing Company, "Refrigerant," in The American Heritage Dictionary of Student Science, 2nd ed., Houghton Mifflin Harcourt Publishing Company, 2014.
[34] | I. Wigmore, "ambient air cooling," TechTarget, 2015. [Online]. Available: http://whatis.techtarget.com/definition/ambient-air-cooling. [Accessed 20 August 2015].
[35] | Mayo Clinic Staff, "Legionnaires' disease," 2 January 2014. [Online]. Available: http://www.mayoclinic.org/diseases-conditions/legionnaires-disease/basics/definition/CON-20028867. [Accessed 21 August 2015].
[36] | Phelps Fan, "variable Frequency Drives (VFD)," 13 August 2009. [Online]. Available: http://phelpsfan.com/pdfs/Variable_Frequency_Drives.pdf. [Accessed 13 August 2015].
[37] | Merriam-Webster.com, "plenum," 2015. [Online]. Available: http://www.merriam-webster.com/dictionary/plenum. [Accessed 27 August 2015].