Title: Disaster Recovery by the Numbers
Course: 2016FA-MCO-110-401 > Section: Module 12: Disaster Recovery

What happens when a company cannot recover from a disaster? This video looks at some of the numbers surrounding recovery failure in a mission critical facility.

Watch this video on YouTube: Disaster Recovery by the Numbers

Video Text:
Mission Critical Facilities need to operate 24/7, but what if they can't? What happens when disaster strikes? 80% of companies that do not recover are likely to go out of business within one month. 51% of businesses that survive after one month will close within two years. 43% of those businesses never reopen. Disaster recovery is critical.

Objectives met:
- C12
- 12.5