Title: Central Energy Plant Basic Overview How a Chiller and Cooling Tower Work Together
Course: 2016FA-MCO-110-401 > Section: Module 4: Facilities Maintenance and HVAC

This video goes in depth on how a chiller and a cooling tower work together in a critical facility.

Central Energy Plant - Basic Overview - How a Chiller and Cooling Tower Work Together by The Controls Freak is licensed CC BY 3.0 and is rehosted here with improved closed captions.

Objectives met:
- C4
- 4.7