Title: 2016FA-MCO-110-401

Module 0: Start Here
  Welcome to MCO110
  Syllabus
  Pacing Guide
  Course Features and Important Information
  Module 0: Introduce Yourself
  Course Licensing Information - CC BY 3.0
Module 1: Introduction to Mission Critical
  Introduction to Mission Critical
  Welcome to Mission Critical Operations
  What Mission Critical Means to Me
  Mission Critical Careers
  Mission Critical Workforce - Module 1
  Careers in Mission Critical Operations
  Mission Critical Terminology
  Mission Critical Acronyms
Module 2: Introduction to Operations Technology
  Introduction to Operations Technology
  Operations Technology
  Facilities Maintenance Functions
  What is Industrial Automation?
  TEDxManitoba - Scott Stirton - Intelligent Buildings
  What is Automation? - Module 2
  Engineering Technology Functions
Module 3: Power
  Power
  Power
  Power Sources
  Three Phase Power
  Energy Storage
  Discussion Board - AC/DC
  Power Redundancy
  Self-Check - Power
  Electrical Safety and Protection
  Arc Flash
  Power Calculations
  References
Module 4: Facilities Maintenance and HVAC
  Facilities Maintenance and HVAC
  Facilities Maintenance Terms
  Facililties Maintenance
  HVAC and Cooling Systems in the Mission Critical Operation
  Components of HVAC Found in MCO
  Self-Check - Facilities Maintenance
  Cooling Tower Designs
  Central Energy Plant Basic Overview How a Chiller and Cooling Tower Work Together
  Data Center Cooling Strategies and Configurations
  Discussion Board - HVAC
  References
Module 5: Control Theory
  Control Theory
  Control Theory Terminology
  Fundamental Control Theory
  Advanced Control Theories
  SCADA System Acronymns
  Self-Check - Control Theory
  Articles of Implementation
  Programmable Logic Controllers
  Implementation of Control Theory
  The History of Ladder Logic
  Discussion Board - Ladder Logic vs Custom Code
  References
Module 6: Safety and Security
  Safety and Security
  Hazard Analysis
  Hazard Communication Standard Pictograms
  Standard Hazards
  Personal Protective Gear and Equipment
  8 Best Practices for Industrial Fire Safety
  Predictable and Unpredictable Events
  Self-Check - Safety and Security
  Cleanliness and Safety
  Physical Security Terminology
  Physical Security
  Security Procedures
  Access Control Systems
  PACE-IT: Physical Network Security Control
  References
Midterm Exam
Module 7: Introduction to Information Technology
  Introduction to Information Technology
  Networking Overview
  Security Overview
  Data Management Overview
  Big Data is Better Data
  Big Data is Growing
  Web Technologies
  Discussion Board - The Web and Mission Critical
Module 8: IT Infrastructure
  IT Infrastructure
  Computer Networks
  Network Devices
  Physical Media
  Network Adapters
  Self-Check - IT Infrastructure
  Network Operating Systems
  Servers
  Clients
  Gateways
  Patch Panels
  Locations
  Discussion Board - A Different Type of Location
Module 9: Networking
  Networking
  Networking Basics
  The OSI Model
  PACE-IT: The OSI Networking Reference Model
  Self-Check - Networking
  TCP/IP and Subnets
  Common TCP/IP Commands
  Network Communication
  Domain Naming Service and HOSTS
  MAC Addresses
  Discussion Board - MAC
Module 10: Cybersecurity
  Cybersecurity
  Cybersecurity Terms
  Cybersecurity Basics
  Avenue of Attacks
  Self-Check - Cybersecurity
  PACE-IT: Common Network Threats (part 1)
  PACE-IT: Common Network Threats (part 2)
  Other Network Threats
  Discussion Board - NIST
Module 11: Data Centers
  Data Centers
  Data Center Design Parameters and Considerations, CBA
  Data Center Design Parameters and Considerations, Electrical Concerns
  Data Center Design Parameters and Considerations, Temperature and Fluid Concerns
  Self-Check - Data Centers
  Inside a Google Data Center
  Component Redundancy
  Power Load and Phase Balancing
  Floors
  Racks
  PACE-IT: Rack and Power Management
  Discussion Board - Under the Sea
Module 12: Disaster Recovery
  Disaster Recovery
  Disaster Recovery
  Disaster Recovery Plans
  Self-Check - Disaster Recovery
  PACE-IT: Security+ 2.8 - Disaster Recovery Concepts
  Disaster Recovery by the Numbers
  Business Continuity Plan
  Discussion Board - Unforeseen Events
  References
Module 13: Determining Mission Criticality and the Mission Critical Mindset
  Determining Mission Criticality
  Why Do We Label Functions As Mission Critical?
  How to Determine What is Mission Critical
  Self-Check - Determining Mission Criticality
  Examples of Mission Critical, Business Critical, and Important Scenarios
  The Mission Critical Mindset
  Mission Critical Mindset for Success
  Discussion Board - A Mind for Mission Critical
  Lab - Joyent Case Study
  References
Final Exam
Instructor Resources
  Instructor Resources