Title: Safety and Security
Course: 2016FA-MCO-110-401 > Section: Module 6: Safety and Security

Safety and Security

In this module safety and security in a mission critical environment will be introduced.  Planning, preparation, hazard analysis, communications, incident reporting, OSHA, and the NSC will be introduced. Physical security will be defined and you will get an introduction to security procedures and access control systems. The learning activities in this module were designed to meet course objective C6.
NOTE: There is not a discussion board topic in this module. There are, however, extra self-contained labs. Discussion board topics resume in module 7.

Objectives

At the end of this module, you will be able to:

- 6.1 Describe hazard analysis and its importance.
- 6.2 List and describe hazard communication pictograms.
- 6.3 List and describe standard industrial hazards.
- 6.4 List and describe different types of personal protective gear.
- 6.5 Describe best practices for fire safety.
- 6.6 Describe best practices for dealing with natural gas leaks.
- 6.7 Describe the importance of custodial services in mission critical facilities.
- 6.8 Describe OSHA and its purpose.
- 6.9 Describe the NSC and its purpose.
- 6.10 Define terminology related to physical security.
- 6.11 Define physical security and its importance.
- 6.12 Describe standard security procedures.
- 6.13 List and describe different types of access control systems.
- 6.14 Describe the special needs for physical network security.

In This Module:

Graded items are represented here with an *

- Hazard Analysis
- Hazard Communication Standard Pictograms
- Standard Hazards
- Personal Protective Gear and Equipment
- 8 Best Practices for Fire Safety
- Predictable and Unpredictable Events
- Self-Check - Safety and Security
- Cleanliness and Safety
- Lab - Imperial Sugar Explosion*
- Lab - About OSHA*
- Lab - About the NSC*
- Physical Security Terminology
- Physical Security
- Security Procedures
- Access Control Systems
- PACE-IT: Physical Network Security Controls
- Quiz - Safety and Security*
- References