Title: Arc Flash
Course: 2016FA-MCO-110-401 > Section: Module 3: Power

Safety and security around electricity is of the utmost importance. This presentation shows you the potential of an electrical event known as an arc flash and gives you information on how you can protect yourself against such an occurance.

Objectives met:
- C3
- 3.9