Title: References
Course: 2016FA-MCO-110-401 > Section: Module 3: Power

References
Reference Number | Reference Information
[1] | E. Csanyi, "What is Poor Power Quality?," 5 June 2015. [Online]. Available: http://electrical-engineering-portal.com/what-is-poor-power-quality. [Accessed 15 July 2015].
[2] | "Electrical Engineering Portal," Csanyi Group, 1 April 2012. [Online]. Available: http://electrical-engineering-portal.com/single-phase-power-vs-three-phase-power. [Accessed 10 July 2015].
[3] | P. M. Curtis, Maintaining Mission Critical Systems in a 24/7 Environment, 2nd ed., Hoboken, New Jersey: John Wiley & Sons, Inc., 2011.
[4] | H. Geng, Data Center Handbook, Hoboken, New Jersey: John Wiley & Sons, Inc., 2015.
[5] | "Shipping Dictionary," Transportation-Dictionary.org, 2008. [Online]. Available: http://www.transportation-dictionary.org/Shipping-Dictionary/Genset_%28Generator_Set%29. [Accessed 13 July 2015].
[6] | R. R. Jones, "Generators and transfer switches for mission critical facilities.," Consulting-Specifying Engineer, vol. 50, no. 6, pp. 20-26, July 2013.
[7] | C. Leoffer and E. Spears, "UPS Basics," October 2011. [Online]. Available: http://search.eaton.com/cgi-bin/query-meta?v:project=etn_powerquality&v:sources=etn_PQ_bundle&cx=-999&query=UPS. [Accessed 14 July 2015].
[8] | "Understanding Emergency Power Off (EPO)," 2003. [Online]. Available: http://dcsarabia.com/whitepapers/20.pdf. [Accessed 19 August 2015].
[9] | C. M. Kozierok, "Uninterruptible Power Supply Types," 2004. [Online]. Available: http://pcguide.com/ref/power/ext/ups/types.htm. [Accessed 14 July 2015].
[10] | Sweetwater, "www.sweetwater.com," 2015. [Online]. Available: http://www.sweetwater.com/insync/delta-conversion-line-ups/. [Accessed 15 July 2015].
[11] | Reliable Resources, "Lessons on: UPS Topologies," 2014. [Online]. Available: http://www.relres.com/news/91/lessons-on-ups-topologies. [Accessed 15 July 2015].
[12] | G. Livengood, "Flywheel UPS Require Less Maintenance," 2014.
[13] | EPA (United States Environmental Protection Agency), "Combined Heat and Power Partnership," 13 February 2015. [Online]. Available: http://www.epa.gov/chp/basic/. [Accessed 30 July 2015].
[14] | Open EI, "CHP / Cogeneration," 9 April 2015. [Online]. Available: http://en.openei.org/w/index.php?title=CHP/Cogeneration&oldid=815799. [Accessed 30 July 2015].
[15] | Department of Energy - Energy Efficiency and Renewable Energy Fuel Cell Technologies Program, "Fuel Cells," [Online]. Available: http://energy.gov/eere/fuelcells/fuel-cells. [Accessed 22 July 2015].
[16] | K. Walsh, "Fuel Cells Equal Cleaner Backup Power," CIO, vol. 20, no. 13, p. 18, 15 April 2007.
[17] | J. Clark, "NC Wind Farm to Power Amazon Data Centers," Data Center Journal, 14 July 2015.
[18] | M. Stout, "The Use of Lithium-Ion Batteries in Uniterruptible Power Supplies," Battery Power Magazine, 18 September 2012.
[19] | American Power Conversion, "Battery Technology for Data Centers and Network Rooms: Safety Codes," 2003. [Online]. Available: http://www.batterypoweronline.com/images/PDFs_articles_whitepaper_appros/APCSafetyCodes.pdf. [Accessed 17 July 2015].
[20] | M. Kulesky, "Improving Electrical Reliability Through GenSET Battery Selection and Maintenance," Mission Critical, vol. 6, no. 4, pp. 58-62, July/August 2013.
[21] | B. Gerl, "Piggybanks for Power," Pictures of the Future, p. 74, 2007.
[22] | "Uptimeinstitute.com," [Online]. Available: https://uptimeinstitute.com/. [Accessed 10 July 2015].
[23] | B. Hatton, "thedatacave.com," 21 February 2014. [Online]. Available: http://www.thedatacave.com/data-center-tiers-explained. [Accessed 10 July 2015].
[24] | Uptime Institute , "Uptime Institute LLC - About UI," 2015.
[25] | M. Stansberry, "Explaining the Uptime Institute's Tier Classification System," Uptime Institute eJournal, 2015.
[26] | Merriam-Webster, "redundancy," 2015. [Online]. Available: http://www.merriam-webster.com/dictionary/redundancy. [Accessed 5 August 2015].
[27] | "DC Power for Improved Data Center Efficiency," California Energy Commission, 2008.
[28] | "grounding," 2015. [Online]. Available: http://dictionary.reference.com/browse/grounding. [Accessed 5 August 2015].
[29] | M. Holt, "Ground Resistance - It's Not What You Think," 30 December 1999. [Online]. Available: https://www.mikeholt.com/technical.php?id=grounding/unformatted/GroundResistance&type=u&title=Ground%20Resistance%20-%20It%27s%20Not%20What%20You%20Think%20%2812-30-99%29. [Accessed 12 August 2015].
[30] | Arresterworks.com, "Animation of How an Arresster Works," 2010. [Online]. Available: http://www.arresterworks.com/pdf_file/what_is_an_arrester.pdf. [Accessed 10 August 2015].
[31] | EATON, "What is a TVSS?," The Data Center Journal, 2006.
[32] | EATON, "EATON's Guide to Surge Suppression," pp. 1-30, June 2007.
[33] | P. Carpenter, "When Lightning Strikes," Mission Critical Magazine, pp. 42-50, November/December 2012.
[34] | R. Tajali, "Arc Flash Analysis: IEEE Method versus the NFPA 70E Tables," January 2012. [Online]. Available: http://static.schneider-electric.us/docs/Electrical%20Distribution/Services/Engineering%20Services/1910DB1201.pdf. [Accessed 7 August 2015].
[35] | EETech Media, LLC., "Calculating Power Factor," [Online]. Available: http://www.allaboutcircuits.com/textbook/alternating-current/chpt-11/calculating-power-factor/. [Accessed 13 August 2015].
[36] | M. McGee, "What Is Power Factor?," Conjecture Corporation, 12 July 2015. [Online]. Available: http://www.wisegeek.com/what-is-power-factor.htm#comments. [Accessed 13 August 2015].
[37] | D. W. Zipse, "Prevent Lightning Strikes with Charge Transfer Systems," Electrical Construction & Maintenance: Power Quality, 1 November 2001.
[38] | M. Allen, "Redundancy: N+1, N+2 vs. 2N vs. 2N+1," 21 March 2014. [Online]. Available: http://www.datacenters.com/news/featured/redundancy-n1-vs-2n/. [Accessed 5 August 2015].
[39] | Dictionary of Construction.com, "service entrance," 2015. [Online]. Available: http://www.dictionaryofconstruction.com/definition/service-entrance.html. [Accessed 5 August 2015].
[40] | chloridepower.com, [Online]. Available: http://www.emersonnetworkpower.com/en-EMEA/Brands/Chloride/Documents/Products/Difference-ATS-and-STS.pdf. [Accessed 10 August 2015].