Title: Robotics in Manufacturing Quiz
Course: Open Campus Advanced Manufacturing

Q: When working in the robot work area, be on guard against ___________ hazards:
- All of the above
- Environmental
- Mechanical
- Power Source
A: All of the above
If right: Try Again!!

Q: Releasing the robot motor brake will cause the robot arm to fall unless supported.
- True
- False
A: True
If right: Try Again!!

Q: Robotic accidents and injuries are caused by all but which of the following:
- Robot Judgement Errors
- Human Errors
- Mechanical Hazards
- Power Source Hazards
A: Robot Judgement Errors
If right: Try Again!!

Q: The _______ envelope is the total area in which a robot is capable of moving with the installation of hardware imposed limiting devices.
- Restricted
- Maximum
- Operating
- Safety
A: Restricted
If right: Try Again!!

Q: Visual indicators and motion sensors are not used in robotic safety.
- True
- False
A: False
If right: Try Again!!

Q: In a robotic work envelope, light curtains ______________.
- Stop the machine if thier path is broken
- Allow the operator to enter the work envelope
- Provide visibility in porrly lit work areas
- Help find flaws in the work
A: Stop the machine if thier path is broken
If right: Try Again!!

Q: One form of environmental hazard is distractions - noise, talking to co-workers, etc.
- True
- False
A: False

Q: Many articulated arm robots are 6 axis robots meaning that the robot has six joints, each on a pivot point for movement.
- True
- False
A: False

Q: In a robotic work envelope, the purpose of a safety mat is to _____________.
- Act as an interlock
- Keep the operator's feet from hurting
- Absorb oil Spills
- Make the work area look neater
A: Act as an interlock
If right: Try Again!!

Q: The ________ envelope is the total area in which a robot is capable of moving it arm, end effector, and tooling fully extended.
- Maximum
- Operating
- Restricted
- Safely
A: Maximum
If right: Try Again!!

Q: Mechanical hazards involving robots include:
- Pinch Points
- Robot Movement
- Electrical Failure
- Human Error
A: Pinch Points; Robot Movement
If right: Try Again!!

Q: Most human errors that lead to robot accidents can be attributed to:
- All anwers
- Unathorized entry into the robot work area
- Bypassing safety devices
- Not following safety procedures
A: All anwers
If right: Try Again!!

Q: Most robot accidents occur during tool change or setup
- True
- False
A: False

Q: Safety devices for robot work area can include:
- All answers
- Physical barriers
- Emergency stops
- Interlocks
A: All answers
If right: Try Again!!

Q: The ________ envelope is the total area in which a robot performs its programmed tasks.
- Operating
- Maximum
- Safety
- Restricted
A: Operating
If right: Try again!!