Title: 3.4 Cornell Method
Course: RITA LEARNING MODULES > Section: 3. Note Taking for Success

The Cornell Method for taking notes is designed to save time and be efficient. There is no rewriting or retyping of your notes. It is a "do it right the first time" system.

Many academics agree this notetaking method is one of the best. Learn more here

How to use the Cornell Method

1. You can create your own Cornell page as pictured above: Use a large, loose-leaf notebook. Use only one side of the paper (later, you can lay your notes out to see the direction of a lecture). Draw a vertical line 2.5 inches from the left side of you paper. This is the recall column. Notes will be taken to the right of this margin. Later, key words or phrases can be written in the recall column. Here is a full page version with ideas for what information goes where on the Cornell note taking layout.
2. OR download the template and try yourself.
3. During a lecture, write notes to capture general ideas. Skip lines to show end of ideas or thoughts. Using abbreviations will save time. Write legibly!
4. After a lecture, read through your notes and make them more legible if necessary. Now, use the recall column. Jot down ideas or key words that give you the idea of the lecture. You will have to reread the lecturer's general ideas and reflect in your own words. Cover up the right-hand portion of your notes and recite the general ideas and concepts of the lecture. Overlap your notes showing only recall columns and you have your review.