Title: LEARNING RESOURCE SPECIALIST - Tutoring Open Positions
Course: RITA LEARNING MODULES

LEARNING RESOURCE SPECIALIST – Computer Information Technology

Corinth, Flower Mound, and Gainesville Campuses; part-time.  Needed in the following areas:

- Programming,
- Web design,
- Network technology,
- Cisco networks,
- Security,
- Databases,
- Microsoft Office.

Travel may be required between campuses.  These position are grant funded and continued employment is contingent on grant funds.

Requirements:

- Must have completed at least one year in CITE or Networking program

- Minimum GPA of 2.5 required; 3.0 preferred; and
- Earned an A or B in the course(s) you wish to tutor, or possess an industry certification(s) in the course(s) you wish to tutor.
- Preferred experience working with students in an academic setting.
- Ability to communicate effectively with faculty, students, and staff.
- Resume, transcripts, and copies of certifications required in addition to application.

May be subject to criminal background check.

Applications will be accepted until filled and located at the IT Career Connection Center - 1400 N Corinth Parkway (across from the Corinth Campus)

Additional information is also available by calling the IT Career Connection Center at 940-498-6440.

NORTHCENTRALTEXASCOLLEGE

IS AN EQUAL OPPORTUNITY EMPLOYER