Title: Canvas Practice Course

Chapter 1 - Please read Getting Started below to open course Modules.
  MT 108 9601 Fall 2016 - quizzes done
  About this course....
  Getting Started
  Lab Safety Rules - Please read before attending a lab.
  MT 108 Syllabus.docx
Chapter 1 - Fluid Power Safety and Theory - Reading Module
  Placeholder for copyright material
Chapter 1 Quiz Module
  Placeholder for copyright material
Chapter 1 Lab Module
  Placeholder for copyright material
  MT108 Lab 1.1 Assessment - Basic Pneumatics LAP 1
Chapter 2 -Devices, Symbols and Instrumentation utilized with both Hydraulic and Pneumatic - Reading Module
  Placeholder for copyright material
Chapter 2 Quiz Module
  Placeholder for copyright material
Chapter 2 Lab Module
  Placeholder for copyright material
  MT108 Lab 2.1 Assessment - Basic Pneumatics LAP 2
Chapter 3 - Hydraulic System Design and Calculations for Industry - Reading Module
  Placeholder for copyright material
Chapter 3 Quiz Module
  Placeholder for copyright material
Chapter 3 Lab Module
  Placeholder for copyright material
  MT108 Lab 3.1 Assessment - Basic Pneumatics LAP 3
Chapter 4 - Pneumatic System Design and Calculations for Industry - Readings Module
  Placeholder for copyright material
Chapter 4 Quiz Module
  Placeholder for copyright material
Chapter 5 - Principles of Pneumatic Pressure and Flow - Lab Module
  Placeholder for copyright material
  MT108 Lab 5.1 Assessment - Basic Pneumatics LAP 4
Chapter 6 - Troubleshooting and Repair of Fluid Power Systems - Lab Module
  Placeholder for copyright material
  MT108 Lab 6.1 Assessment - Troubleshooting and Repair of Fluid Power Systems