Title: Week 2 Prelab Quiz
Course: 17SP-CLT-135-GH1B1-BIOCHEMICAL LAB TECHNIQUES > Section: PreLab Quizzes

Q: A technician is tasked with making the solution in question 1. They mix the buffer solution and the pH is about 4.5 The technician need the pH to be at 5.5. They use potassium hydroxide (KOH) to raise the pH to the correct level. What is problematic about the way that the pH was changed?

Q: What are some of the reasons that organizations use SOPs?