Title: Week 3 Prelab Quiz
Course: 17SP-CLT-135-GH1B1-BIOCHEMICAL LAB TECHNIQUES > Section: PreLab Quizzes

Q: What is the reason for placing the glass wool in the bottom of the syringe?

Q: Follow the link provided to a paper outlining the separation of proteins from beef heart. Read the procedures for the preparation of the heart for the separation. Discuss the differences in this procedure versus the one used in class. What materials/instrumentation do we not have available?

Link