Title: Module 15 Learning Objectives
Course: Canvas Practice Course > Section: Module 15

Chapter 15 — Fluid Power System Maintenance and Troubleshooting

- Identify common maintenance issues and problems that arise for hydraulic systems and pneumatic systems.
- Describe the procedure for successfully troubleshooting fluid power systems.
- Describe common hydraulic and pneumatic system troubleshooting
- Describe common fluid power system troubleshooting methods.