Title: Module 1 Introduction-3
Course: Canvas Practice Course

Module 1 Introduction

Fluid power systems are used to control and provide power for various industrial and commercial processes and equipment.  The fluid used in fluid power systems can be either liquid or gas.  For a fluid power system to function, there has to be a power source, a load, and a means of transmission.