Title: Module 9 Learning Outcomes
Course: Canvas Practice Course > Section: Module 9

- Explain electrostatic discharge and conductivity
- Identify causes of ESD
- Recognize how to protect work areas from ESD
- Recognize how to use wrist grounding straps to protect electronic components from ESD
- Recognize procedures for handling electronic components safely to prevent ESD