Title: Module 5 Objectives
Course: Canvas Practice Course > Section: Module 5

Module 5:      Chapter 16 - Capacitive AC circuits

- Identify common features of pure capacitive circuits.
- Define and describe capacitive reactance.
- Explain how a pure capacitive AC circuit is used to analyze and understand voltage, current, and capacitive reactance relationships.
- Describe power in capacitive circuits.
- Explain how to calculate source voltage in series resistive capacitive circuits.
- Identify the difference between power factor in series resistive capacitive circuits and inductive-resistive circuits.
- Explain how changes in frequency can cause changes in circuit parameters in series resistive-capacitive circuits.
- Describe the function of capacitance is series resistive-capacitive circuits.
- Identify the main features of parallel resistive-capacitive circuits.
- Identify common methods for calculating total current and impedance in parallel resistive-capacitive circuits.
- Describe how changes in frequency affect parallel resistive-capacitive circuits.
- Identify the main characteristics of capacitance in parallel resistive-capacitive circuits
- Describe the main features of series/parallel resistive-capacitive circuits.