Title: Grading Policy
Course: Canvas Practice Course > Section: Start Here

Grading Scale:

91.0% - 100% | = | A
81.0% - 90% | = | B
71.0% – 80% | = | C
61.0% – 70% | = | D
60% and Below | = | F

Methods of Evaluation and Grading Policy.  Students shall demonstrate an understanding of the basic fundamentals of electricity.  Students are given a mid-term and a final examination.  Homework assignments and Laboratory assignments shall be checked off for completion throughout the semester and account for part of their grade.   Attendance is also given weight in evaluation of student performance.

Grading Categories:

Quizzes | = | 40%
Homework | = | 25%
Lab Assignments | = | 25%
Attendance | = | 10%
Total | = | 100%

Attendance: Students are expected to attend all class sessions. If a student is unexpectedly unable to attend class, it is the student’s responsibility to contact the instructor to discuss the absence and to determine what work has been missed. Preplanned absences need to be discussed with the instructor as soon as possible to determine the best way to complete assignments.

Assignments: Completion of assignments in a timely manner is key to student success.  Assignments are required to be completed and turned in to the instructor by the due dates. ANY assignment later than one week beyond the due date will NOT be accepted unless prior arrangements have been made with the Instructor.  Additionally, all late assignments will be reduced by 10% of the total grade received.