Title: Unit 1 lesson 2; Prepare 2
Course: WGF 106 DEVELOPMENT > Section: Content

Title | Reading Assignment
Image |

Sub-Title | Defining Indoor Air Quality Terms… Technical Solutions
Content
When addressed systematically and aggressively, an IAQ program that focuses on the Six Technical Solutions will deliver a healthier school environment. The Six Technical Solutions are grounded in the IAQ Tools for Schools Action Kit, the Center for Disease Control’s School Health Policies and Programs Study and the management practices of leading school IAQ programs. The Six Technical Solutions are:

- Quality HVAC.
- Control of Moisture/Mold.
- Strong Integrated Pest Management (IPM).
- Effective Cleaning & Maintenance.
- Smart Materials Selection.
- Aggressive Source Control.
Links/Uploads | IAQ Action Kit for Schools   http://www.epa.gov/iaq/schools/actionkit.html
Attributions | Image and content courtesy of “IAQ Action Kit for Schools” – U.S. Environmental Protection Agency