Title: Lesson 2 To-Do List
Course: WGF 106 DEVELOPMENT > Section: Assignments

Title | Lesson 2 To-Do List
Objective
- Recognize successful building benchmarking
- Identify the five types of internal and external benchmarks
- Develop a benchmarking plan
- Advocate the adoption and implementation of the benchmarking plan results
- Review benchmarks on a regular basis, and apply/re-apply those defined results
Prepare #1
- Reading assignment – ENERGY STAR Building Upgrade Manual – Chapter 2: Benchmarking
- Viewing video assignment – ENERGY STAR Benchmarking System
Prepare #2 | - Reading assignment – ENERGY STAR Building Upgrade Manual – Chapter 2: Benchmarking
Practice
- Complete and Submit the discussion board Introduction Question;
- Respond to peer’s discussion board question
Perform | - Complete Exam 1
Links/Uploads
ENERGY STAR Building Upgrade Manual (Chapter 2 – Benchmarking)

http://www.wbdg.org/ccb/STAR/energystar_bldgupgrademanual.pdf

ENERGY STAR Performance Rating (benchmarking) System

http://www.youtube.com/watch?v=qNdkx-6XSYA

NOESIS Energy – Benchmarking: Best Practices

http://www.youtube.com/watch?v=HERtERLy5Yk