Title: Lesson 2 To-Do List
Course: WGF 106 DEVELOPMENT > Section: Content

Objective
- Be able to identify fundamental programming and performance in the uses and applications for quality IEQ systems
- Explore the facility potential issues of IEQ systems and why
- Investigate IEQ systems, including its manufacturer(s), and how they came to be in facility use
- State about what I can expect to pay for proper IEQ  (both acquisition and operating costs)
- Assemble how much it costs (or saves) to use data IEQ programming
Prepare | - Read – The Essential Elements of IEQ Programming
Practice | - Read – Basic IEQ Networking
Practice
- Complete and Submit the discussion board Introduction Question (5-pts.);
- Respond to peer’s discussion board question (5-pts.);
Perform | - Complete Quiz 5 (20-pts.)
Links/Uploads | Integrating Indoor Environmental Quality with Energy Efficiency http://www.epa.gov/iaq/largebldgs/energy_cost_and_iaq/project_report7.pdf