Title: Lesson 1 To-Do List
Course: WGF 106 DEVELOPMENT > Section: Content

Objective
- Recognize the basic symptoms of IEQ problems (i.e. human comfort factors and relevant standards, etc.)
- Explore the facility potential issues of IEQ on occupant performance (i.e. causes and risk of problems, etc.)
- Investigate IEQ systems, including manufacturers specifications, and how they came to be in facility use
- State about what I can expect from an IEQ problem solution (both, doing nothing and corrective costs)
- Assemble how much it costs (or saves) to use
Prepare #1
- Read – Human Comfort Factors and Relevant Standards
- View – IAQ Complaints in the Office
- Read – Human Comfort Relevant Standards
Prepare #2
- Read – Causes of IEQ Problems
- View – NIOSH Health Hazard Evaluations
- Read – Risks of IEQ Problems
Practice
- Complete and Submit the discussion board Introduction Question (5-pts.);
- Respond to peer’s discussion board question (5-pts.);
Perform | - Complete Lab Activity #3 (25-pts.)
Links/Uploads | NIOSH – Center for Disease Control              http://www.cdc.gov/niosh/topics/indoorenv/ IEQ Factsheet – Illinois Department of Public Health http://www.idph.state.il.us/envhealth/factsheets/indoorairqualityguide_fs.htm NIOSH Health Hazard Evaluation – Centers for Disease Control and Prevention http://www.youtube.com/watch?v=CP_W121FmZQ