Title: Local Building Codes
Course: HAC 241 -Building Systems and Performance Spring 2015 > Section: HAC 241 -Building Systems and Performance Spring 2015

Discuss local building codes and how they affect our duties as HVAC techs, constructions workers, and home performance auditors.