Title: Assignment
Course: HAC 241 -Building Systems and Performance Spring 2015 > Section: HAC 241 -Building Systems and Performance Spring 2015

Assignment

Research Assignment

Research the local building codes in Illinois and come to lab with a summary of what your research revealed.  Your summary can be short.  The goal here is to identify the sources in which you go to for local building codes.