Course: SAT 272 Construction of Sustainable Landscaping - Spring 2015

Reading and Multimedia Assignments

Multimedia Assignment 4
Multimedia Assignment 4
This website by the United States EPA discusses the construction of an Experimental Stormwater Parking Lot.

Scroll to the bottom of the page to see the short video presentation.