Title: Unit 13 Fact Sheet
Course: SAT 272 Construction of Sustainable Landscaping - Spring 2015 > Section: SAT 272 Construction of Sustainable Landscaping - Spring 2015

Unit 13 Fact Sheet

Construction Site Preparations

Create a one-page fact sheet to distribute to your customers listing common equipment needed for landscape maintenance and new construction projects.

Research and identify four important tools for preparing a construction site for a landscape upgrade. Document your sources on a separate page.

Include the following details:

- The name and description of each piece of equipment
- Approximate costs and expected life span of their use
- Summary of how each one would be used
- Safety consideration for using the tools
- Optional pictures to enhance this fact sheet

- Citation Referencing and Formatting Guidelines.pdf (87.8 KB)
- Fact Sheet Rubric.pdf (63.43 KB)