Course: SAT 272 Construction of Sustainable Landscaping - Spring 2015

Reading and Multimedia Assignments

Multimedia Assignment 2
Multimedia Assignment 2

This video covers common safety precautions for operating and maintain mowers.

"General Guidelines for Lawnmower Safety," by The University of Georgia College of Agriculture and Environmental Sciences, Standard YouTube License

Click here to open the video above in a new tab.