Title: Unit 14 Lab
Course: SAT 272 Construction of Sustainable Landscaping - Spring 2015 > Section: SAT 272 Construction of Sustainable Landscaping - Spring 2015

Unit 14 Lab

Unit 14 Lab

This lab will encompass techniques used in maintenance and construction activities at a customer site.

1. We will use a landscape design document with associated lists for various projects needed to complete the total landscape job.
2. Using this list, we will create a construction schedule for labor needed, materials needed.
3. We will create a timeline showing how it will all be accomplished.
4. We will also update the weekly maintenance schedule for this house once the construction has been completed.

 | Lab Rubric
Points | Description
20 | Provides thorough schedule, materials list, and timeline.
5 | Document is logically organized in a professional manner.