Course: PMT 250 Multi-Axis CNC Programming (Section 060)

HA5C Lessons

Activating the HA5C Indexer on the Control
Activating the HA5C Indexer on the Control

- When installing the HA5C indexer set it on the table and bolt it down.

Use the "T" slot that is closest to the operator.
- Turn the power off to the control and also turn the main power off in back of the machine.

- Route the wiring to the back of the machine.

- Plug in the 2 wires in the proper place on the side of the electrical box in the back of the machine.

- Turn on the main power. (Back of machine)

- Turn control back on.

- Perform the Power Up Restart operation.

- Press the Setting/Graph button to get to the settings page.

- Enter 30 and press the arrow down button.

- Arrow to the right until you see the HA5C P3 indexer. (Or the indexer that you are using)

- Press enter to load parameters.

- Change setting 34 to the diameter of your work.

- Now you need to indicate the HA5C square to the table.

- Mount and indicator in a tool holder.

- Place the needle on your indicator on the end of your work. (Zero indicator)

- Jog the "X" axis and read the indicator movement.

- Adjust the HA5C Indexer to make the indicator read zero the entire length of work.

- The Indexer is now ready to use.