Title: Quiz
Course: PMT 250 Multi-Axis CNC Programming (Section 060) > Section: PMT 250 Multi-Axis CNC Programming (Section 060)

Q: When lifting a heavy object what is the best way to lift this object?
- With your back
- With your arms
- With your legs
A: With your legs

Q: Where should your cutting tools be stored when they are set-up?
- In a tool holder rack
- On the floor
- On the work bench
A: In a tool holder rack

Q: What is another obstacle in the CNC machine tool when using a HA5C indexer?
- Wrenches
- Tooling
- Wiring
A: Wiring

Q: When programming a HA5C indexer you must double check the program for what type of moves?
- Any feed moves and rapid moves that might cut into the indexer
- Tool changes
- All aspects of the program
A: All aspects of the program

Q: Which axis rotates the HA5C indexers?
- X
- Y
- B
- A
A: A

Q: What is the proper programming method to rotate the indexer?
- G00 A30
- G00 A30.0
- G00 X30
- G00 X30.0
A: G00 A30.0

Q: What are the advantages of using an indexer?
- Complete part in one operation
- Perform easier secondary operation
- Machine complex parts
- All of the above
A: Machine complex parts

Q: What is the main way of holding the part in the indexer?
- 5C collet
- 16C collet
- 3 jaw chunk
- Fixture
A: 5C collet

Q: What is the largest diameter that can be machines in the main holding device?
- 1.000
- .875
- 1.500
- 1.125
A: 1.125

Q: What M code is used for a local sub program?
- M97
- M98
- M99
- M30
A: M97

Q: What M code returns to the main program?
- M97
- M99
- M98
- M30
A: M99

Q: The P number needs to the same as what in the program?
- Program number
- The line number of the start of the sub program
- The number of times that the program will repeat
A: The line number of the start of the sub program

Q: When placing an L number in the local sub programming line?
- The line number of the start of the sub program
- Program number
- The number of times that the program will repeat
- The number of times the local sub will be repeated
A: The number of times the local sub will be repeated

Q: What T slot should the indexer be mounted to the table?
- 1st slot
- 2nd slot
- 3rd slot
A: 1st slot

Q: What setting is used to pick the indexer that you are using?
- 30
- 34
- 40
- 43
A: 30

Q: How do you indicate the indexer part straight?
- Off the indexer
- Along the part
- Off a T slot
A: Along the part

Q: Tool lengths offset should be touched off where?
- The table
- The indexer
- Top of the part
A: Top of the part

Q: Where is the most common place for the work offset for an indexer?
- The indexer side
- The end of the part
- Center of the part
A: The end of the part

Q: You can plug in the indexer to the back of the CNC machine should be powered up?
- True
- False
A: False

Q: Tool clearance is big concern when setting up the indexer?
- True
- False
A: True