Title: Quiz
Course: PMT 250 Multi-Axis CNC Programming (Section 060) > Section: PMT 250 Multi-Axis CNC Programming (Section 060)

Q: What type of moves should the programmer be aware of when programming a 5 axis machine?
- Linear moves
- Rapid moves
- All moves
- Do not need to worry about any moves
A: All moves

Q: What type of machining is recommended when using a CNC vertical mill?
- Climb
- Conventional
A: Climb

Q: Another obstacle besides the trunnion the programmer should also check on what part on the machine?
- The control
- Machine table
- The wiring
A: The wiring

Q: Another obstacle besides the trunnion the programmer should also check on what part on the machine?
- 3” inches
- 4” inches
- 5” inches
- 6” inches
A: 5” inches

Q: Where is the tool change location on the 5 axis located?
- Front left corner
- Back left corner
- Back right corner
- Front right corner
A: Front right corner

Q: The A axis has how many degrees of rotation?
- 100°
- 120°
- 150°
- 180°
A: 120°

Q: The B axis a rotate how many degrees?
- 120°
- 180°
- 270°
- 360°
A: 360°

Q: Which part of the trunnion should you indicate first?
- Platter is flat
- Rotation is 90°
- Center of platter
A: Platter is flat

Q: Where should you place the indicator when indicating the X axis?
- On the casting
- On the part
- On the platter at 90°
A: On the platter at 90°

Q: The last indicting operation is?
- X axis
- Center of rotation
- Platter is flat
A: Center of rotation

Q: Using the same tool on all 5 sides requires a Z value in each work offset.
- True
- False
A: False

Q: To put a chamfer on a top plane of a part you would rotate the part the A axis needs to be at 45°.
- True
- False
A: False

Q: How many work offsets will need to set when machining on all sides of the part using the trunnion?
- 2
- 3
- 4
- 5
A: 5