Course: PMT 250 Multi-Axis CNC Programming (Section 060)

HAAS HRT210 Lessons

Activating the HA5C Indexer on the Control
Activating the HA5C Indexer on the Control

- Turn the power off to the control and also turn the main power off in back of the machine.

- Route the wiring to the back of the machine.

- Plug in the 2 wires in the proper place on the side of the electrical box in the back of the machine.

- Turn on the main power. (Back of machine)

- Turn control back on.

- Perform the Power Up Restart operation.

- Press the Setting/Graph button to get to the settings page.

- Enter 30 and press the arrow down button.

- Arrow to the right until you see the HRT210 indexer. (Or the indexer that you are using)

- Press enter to load parameters.

- Change setting 34 to the diameter of your work.