Title: Quiz
Course: PMT 250 Multi-Axis CNC Programming (Section 060) > Section: PMT 250 Multi-Axis CNC Programming (Section 060)

Q: Which jog increment should not be used when using the probe?
- .0001
- .001
- .01
- .100
A: .100

Q: OMI stands for what on the probing system?
- Optical Machine Interface
- Office Manual Input
- Optical Manual Input
- On Machine Input
A: Optical Machine Interface

Q: Where is the OMI mounted on the machine?
- CNC Table
- Control
- On the machine
- In the spindle
A: CNC Table

Q: OMP stands for what on the probing system?
- Optical Manual Program
- Optical Machine Program
- Optical Machine Probe
- Offset Machine Probe
A: Optical Machine Probe

Q: Where is the OMI mounted on the machine?
- CNC Table
- Control
- On the Machine
- In the Spindle
A: On the Machine

Q: OTS stands for what on the probing system?
- Open Tool Setter
- Optical Timed Setter
- Optical Tooling System
- Optical Tool Setter
A: Optical Tool Setter

Q: How many options are there when setting up the tool length options?
- 1
- 2
- 3
- 4
A: 4

Q: What is the first step when starting the tool length probing system?
- Clear the MDI screen
- Load your tools
- Clear tool offsets
- Nothing
A: Clear tool offsets

Q: When setting up the tools what must be known?
- Diameters
- Gauge Length
- Tool holder type
- Both A and B
A: Both A and B

Q: How many types of tools are available in the tool offset page?
- 3
- 4
- 5
- 6
- 7
A: 7

Q: What is the HEIG number in the offset page mean?
- The distance that the cutter will be measured below the probe
- The gauge height
- The total height of the tool holder
A: The distance that the cutter will be measured below the probe

Q: What screen do you use to load all your tools before using the probing options?
- Memory
- Current Commands
- MDI
- Edit
A: MDI

Q: What is the last tool that you should probe?
- Last tool in your program
- The first tool in your program
- The OMP
- No tools
A: The OMP

Q: The OMP be rotating when using it.
- True
- False
A: False

Q: The OMP does not need to touch off on the OTS.
- True
- False
A: False

Q: The OMP will need to be touched off where Z zero is in the program.
- True
- False
A: True

Q: How may work offset probing options are there?
- 8
- 9
- 10
- 12
A: 12

Q: When the probing software is asking for the Incremental X what does this measurement?
- The length of the part
- The length that the probe will move in the X axis to take a measurement
- The program incremental movements
A: The length that the probe will move in the X axis to take a measurement

Q: Where should the probe be position before pressing cycle start for probing your part?
- Anywhere around the part
- Center of the part
- Over the position where your work offset is on your part
A: Over the position where your work offset is on your part

Q: There will be a Z offset number in the G54 work offset page when done?
- True
- Fasle
A: True