Course: PMT 250 Multi-Axis CNC Programming (Section 060)

HAAS HRT210 Lessons

Setting up the Offsets for a HRT210 Indexer
Setting up the Offsets for a HRT210 Indexer

- Work Offsets will be at different locations depending on the programmer and the parts that are being produced.
- In the example below the programmer is using 6 Work Offsets.
  - G54 and G55 are the top surface of the parts.
  - G56 and G57 are the right surface of the parts.
  - G58 and G59 are the left surface of the parts.

Setting Work Offsets
- Work Offsets can be found be using any type of tools that you have used in the past.
  - Edge Finder
  - Dial Test Indicator
  - Probe
  - Finding the "X" axis work offset.
(We will be using an edge finder to find our Work Offsets).

- Using an edge finder find the end of your part.
- Move in half the diameter of the edge finder.
- Continue to set your Work Offsets for your G54 and G55 locations.

Setting Work Offsets for your right and left surfaces of your parts

Setting the G58 “Y” Axis

Setting the G58 “X” Axis

Set all of the rest of the Work Offsets that you will be using

Note: The “A” axis offset was established when we indicated the Chick WorkHolding System.

The “Z” axis offset was established when setting Tool Length offsets.

Setting Tool Lengths

- Touch off tool 1 on top of your part at the G54 location.
- Press Tool Offset Measure button to set Tool 1.

(Continued on next page)