Course: PMT 250 Multi-Axis CNC Programming (Section 060)

HAAS HRT210 Lessons

Setting up the Offsets for a HRT210 Indexer (Continued)
Setting up the Offsets for a HRT210 Indexer (Continued)

- Next using the same tool (Tool 1) move the tool to G58 position and touch off on that part.

Note: For this example I used the side of the Chick WorkHolding system for my “Z” zero for my side surfaces.

- Press the arrow down button to a tool number that you will not be using in the program.  (Tool 8)
- Press Tool Offset Measure button to measure the distance from the top surface of the part to the “Z” zero locations of the sides of the part.

- If you subtract 3.5130 from 6.9160 you now have the distance between the top surface and the side surfaces. (3.403)
- Going back to the Work Offset table you can input the “Z” values in all the side surfaces, this will be always a negative number in most cases.

- Set the rest of all your tools off the top of your G54 surface.

- Do not forget to input tool diameters if you are using cutter compensation in your program!