Course: PMT 250 Multi-Axis CNC Programming (Section 060)

Probing Lessons

Tool Length Options
Tool Length Options

There are 4 options when touching off tools use the probe.

0 = No Probing

1 = Length Probing (rotating)

2 = Length Probing (non-rotating)

3 = Length and Diameter Probing (rotating)

Note the spindle will rotate in reverse!