Course: PMT 250 Multi-Axis CNC Programming (Section 060)

Bar Feeder Lessons

Capacity of our Servo Bar 300 and when to use a Bar Feeder
Capacity of our Servo Bar 300 and when to use a Bar Feeder
- Bar diameters up to 3.125 inches.

Our machine only can load up to 1.500 diameter material.
- 60 inch length of bars.

Recommend only use 48 inch length bars.

- Use that bar feeder when you need to make many parts.

The minimum number of parts can be as low as 2 parts. But it depends on the how complex the parts are that are being produced.