Course: PMT 250 Multi-Axis CNC Programming (Section 060)

Bar Feeder Lessons

Bar Feeder Set-Up - Step 6
Bar Feeder Set-Up - Step 6

- Press MDI button.
- Alter the Q value to Q2
- Press Cycle Start

This will push bar to variable 3101 or 2.500 from the collet.

CC BY 3.0, Southwestern Community College

If you cannot see the video above, click here to open a tab to watch the video.