Title: Unit 5 Quiz
Course: ENGY 211 Biofuels Systems Technology > Section: ENGY 211 Biofuels Systems Technology

Q: Solids are more difficult to handle that liquids or gases.
- True
- False
A: True

Q: There is one optimum method for material handling of biomass and that is with conveyors.
- True
- False
A: False

Q: Site conditions and the lowest cost to meet the demand are the normal determinants for material handling methods.
- True
- False
A: True

Q: Which of following is not a normal method of receiving biomass materials at an industrial plant?
- Live-bottom van
- Truck dumps
- Railroad
- Farm wagons
A: Farm wagons

Q: Dry storage is preferred for agricultural residue only if it is covered or in silos.
- True
- False
A: True

Q: Which of following is NOT a dry storage consideration?
- Heat energy requirements for combustions
- Fuel moisture content
- Railroad access
- Fuel preparation requirements
A: Railroad access

Q: Open storage is not used to prevent fuel supply interruptions.
- True
- False
A: False

Q: In biomass storage, the "chimney effect" refers to gravity-fed fuel.
- True
- False
A: False

Q: When in the 4–5 acidic range, the pH of the pile can corrode concrete or steel storage.
- True
- False
A: True

Q: Which of the following are considered when determining storage requirements?
- Safety
- Space
- Cost efficiencies
- All of the above
A: All of the above