Title: Unit 8 Quiz
Course: ENGY 211 Biofuels Systems Technology > Section: ENGY 211 Biofuels Systems Technology

Q: Which of the following is NOT true about the environmental impact of short-rotation tree farms?
- Reduce animal habitat and forage
- Increase soil temps, water runoff, erosion, soil compaction, aeration
- Increases soil nutrients
- Has lower impact than ag crops
A: Increases soil nutrients

Q: Combustion products from large commercial plants and power generation stations are regulated for airborne emissions and solid wastes.
- True
- False
A: True

Q: The NAAQS were developed primarily to protect public health.
- True
- False
A: True

Q: NAAQS is an acronym for which of the following?
- National Air Affect Quality Standards
- National Ambient Air Quality Standards
- National Air Archive Quality Stores
A: National Ambient Air Quality Standards

Q: NAAQS secondary missions were to protect soil, water, vegetation, materials, animals, weather, visibility, personal comfort, and well-being
- True
- False
A: True

Q: The Clean Air Act of 1977 has three classes of air quality known as Prevention of Significant Deterioration.
- True
- False
A: True

Q: NSPS limits the amount of pollutants that can be emitted per million Btu of burned fuel.
- True
- False
A: True

Q: Boiler MACT refers to maximum achievable control technologies and limits PM, metals, NO2, SO2, and organics in stack emissions.
- True
- False
A: True

Q: Biomass-fired plants give the byproduct to farmers to put back into the soil removing it from the waste category to the product category.
- True
- False
A: True

Q: The two major divisions of safety are that of personnel involved with fuel supply and the safety of the fuel supply itself.
- True
- False
A: True