Title: Unit 8 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: Human error plays an important role in an asset’s life cycle.
- True
- False
A: True

Q: One cause of human error is excellent equipment design.
- True
- False
A: False

Q: Maintenance error does not occur due to incorrect repair.
- True
- False
A: False

Q: A good understanding of time spent on various maintenance tasks can be useful to analyze maintenance errors.
- True
- False
A: True

Q: Poor maintenance procedures can contribute to human error.
- True
- False
A: True

Q: To reduce human error, review maintenance procedures periodically.
- True
- False
A: True

Q: Training is not important in reducing maintenance error.
- True
- False
A: False

Q: The Markov Method is one way to determine inventory stock needed.
- True
- False
A: False