Title: Unit 12 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: Low equipment reliability means a higher need for maintenance.
- True
- False
A: True

Q: Plant performance is based upon reliability.
- True
- False
A: True

Q: Production scheduling is not a root cause factor of reliability.
- True
- False
A: False

Q: Time-dependent rate of assets follows the bathtub rate curve.
- True
- False
A: True

Q: The wear-out period of an asset occurs when it passes it useful life period.
- True
- False
A: True

Q: One cause of failure during the burn-in period is inadequate materials.
- True
- False
A: True

Q: One reliability measure is the reliability burn in period.
- True
- False
A: False

Q: FEMA is a widely used method to evaluate design.
- True
- False
A: True