Title: Unit 5 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: Corrective maintenance is the remedial action carried out due to failure or deficiencies discovered during PMs.
- True
- False
A: True

Q: Fail-repair corrective maintenance is restoring an asset to its operational state.
- True
- False
A: True

Q: Corrective maintenance is not concerned with the salvage function.
- True
- False
A: True

Q: Corrective maintenance has hundreds of different sequential steps in performing that maintenance.
- True
- False
A: False

Q: Preparation time is not a part of active repair time.
- True
- False
A: False

Q: It is important to be efficient in fault recognition, location, and isolation of failed assets.
- True
- False
A: True

Q: Human factors are not considered when analyzing maintenance actions.
- True
- False
A: False

Q: Mean Corrective Maintenance Time is a measure of corrective maintenance.
- True
- False
A: True