Title: Unit 9 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: Quality in maintenance is defined as conformance.
- True
- False
A: True

Q: Maintenance quality is important because it provides a degree of confidence that maintained or repaired assets will operate reliably and safely.
- True
- False
A: False

Q: Good quality maintenance work contributes to the reduction or elimination of unexpected failures.
- True
- False
A: True

Q: When performing a maintenance repair, it isn’t necessary to look at other parts of the equipment or job for additional repair needed.
- True
- False
A: False

Q: Avoid unsafe maintenance practices.
- True
- False
A: True

Q: It isn’t necessary to test equipment prior to putting it back into operation.
- True
- False
A: False

Q: A control chart is a graphical method used to evaluate whether a process is in a state of control.
- True
- False
A: True

Q: Two important areas of maintenance worker safety are respiratory protection and safety protective clothing.
- True
- False
A: True