Title: Unit 4 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: One objective of Preventive Maintenance is to inspect assets to ensure they are operating within their normal operational specifications.
- True
- False
A: True

Q: Preventive maintenance function includes installing worn out to time-based components to ensure equipment remains in its normal operational mode.
- True
- False
A: True

Q: A poor PM program has high equipment use due to failures.
- True
- False
A: False

Q: Poorly designed PM programs have higher equipment repair costs.
- True
- False
A: True

Q: One question to ask when evaluating a PM program is: What percentage of downtime is due to maintenance?
- True
- False
A: True

Q: When designing a PM program, choose a few areas to begin the program and concentrate on those and the associated record keeping.
- True
- False
A: True

Q: PMs should be done whenever someone has the time.
- True
- False
A: False

Q: One measurement of a PM program is the mean preventive maintenance time.
- True
- False
A: True