Title: Unit 6 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: Reliability-centered maintenance is a systematic process used to determine what has to be accomplished to ensure an asset is in its designed operating status.
- True
- False
A: True

Q: A goal of RCM is to develop design-associated priorities that facilitates PMs.
- True
- False
A: True

Q: RCN is not system or equipment focused.
- True
- False
A: False

Q: Failure data is not important with RCM.
- True
- False
A: False

Q: One step of RCM is to implement decisions.
- True
- False
A: True

Q: Predictive maintenance is not part of an RCM program.
- True
- False
A: False

Q: NDT is a necessary party of predictive maintenance.
- True
- False
A: True

Q: Applying RCM improves safety, environment protection, product quality, extends asset life and teamwork, creates a historical equipment database, and other positive functions.
- True
- False
A: True