Title: Unit 13 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: Maintainability is a design parameter intended to increase repair time.
- True
- False
A: False

Q: Downtime is the total time in which an asset is not in satisfactory operable condition.
- True
- False
A: True

Q: There is only one factor responsible for the importance of maintainability.
- True
- False
A: False

Q: The main objective of maintainability is to maximize equipment and facility availability.
- True
- False
A: True

Q: Validation is determining downtime in an asset’s life cycle.
- True
- False
A: False

Q: Phase III of an asset's life cycle is Production.
- True
- False
A: True

Q: Accessibility is an important design consideration.
- True
- False
A: True

Q: Standardization should be the central goal of design.
- True
- False
A: True