Title: Unit 2 Quiz
Course: ENGY 113 Plant Maintenance > Section: ENGY 113 Plant Maintenance

Q: The maintenance function is performed under calm and organized conditions.
- True
- False
A: False

Q: Maintenance practices have remained the same since the end of the Industrial Revolution.
- True
- False
A: False

Q: Maintenance engineering is a deliberate and methodical analytical process.
- True
- False
A: True

Q: About 80% of annual maintenance costs are spent on chronic failure of machines, systems and people.
- True
- False
A: True

Q: PMs are carried out on a planned, periodic, and specific schedule.
- True
- False
A: True

Q: Predictive maintenance involves the use of analytical equipment to accurately diagnose an assets condition during operation.
- True
- False
A: True

Q: Maintenance quality is the degree to which as asset satisfies the requirement of the user and/or customer.
- True
- False
A: True

Q: A Maintenance Person is one who conducts PMs, responds to service calls, and/or performs corrective maintenance.
- True
- False
A: True