Title: Reading
Course: BLD 168 Strategies for Safe Handling of Hazardous Substances > Section: BLD 168 Strategies for Safe Handling of Hazardous Substances

Reading

(1/2)
Course Introduction

The following documents are to help you prepare and be successful in this course.  Please click on each link to download the document and read throughout the course.
Click on the item below to download Certified Renovator Manual
- initial_renovator-student_oct2011.pdf (19.24 MB)

Click on the item below to download Appendix 1.
- EPAs Renovation Repair and Painting Program Final Rule.pdf (331.3 KB)

Click on the item below to download Appendix 3.
- Renovate Right_Important Lead Hazard Informaiton for Families Child Care Providers and Schools.pdf (7.34 MB)

Click on the item below to download Appendix 4
- Small Entity Compliance Guide to Renovate Right.pdf (2.09 MB)

Click on the item below to download Appendix 5
- Steps to LEAD SAFE Renovation Repair and Painting.pdf (6.58 MB)

Click on the item below to download Appendix 6
- Hands-on Exercises.pdf (328.03 KB)

Click on the item below to download Additional Requirements of HUD's Lead Safe
- rrp-hud-req-oct11.pdf (85.16 KB)