Title: Disucssion Board
Course: HET 293 - HVAC and Building Codes > Section: HET 293 - HVAC and Building Codes

HET 293 HVAC Building Codes

In the HVAC field a service technician or installer will work with many other tradesmen and because the equipment has multiple components (Electrical, ductwork, drain piping, water piping, and refrigeration piping), the HVAC worker should have an in-depth knowledge of other trades. Therefore, Code administration and enforcement is crucial for proper building construction.

1. With this in mind, why is the scope of the building trade code so important?
2. What is the IRC and what is its purpose?
3. How does the IRC compare to the other International Building Code?
4. With the licensing of contractors, what protection does the homeowner have when there is a problem with the installation of equipment?
5. What is the purpose for permits, and inspections?
6. Do you feel it is necessary to follow building codes at all times?