Title: Unit 7 Assignment
Course: HET 293 - HVAC and Building Codes > Section: HET 293 - HVAC and Building Codes

Unit 7 Assignment

Unit 7 Assignment

HET 293 Week 7 Assignments

Read chapter 13, 14, and 15 in Building Code Basics; Residential , Plumbing, Electrical, and Energy Efficiency

- Your Post is due by Wednesday of the current week and you must respond by Saturday night by 11:59 PM.
- Post a two paragraph response to my questions for this week’s subject and respond to at least two classmates
- Discussion: Post a website that adds information to this week’s topic.