Title: Unit 4 Assignment
Course: HET 293 - HVAC and Building Codes > Section: HET 293 - HVAC and Building Codes

Unit 4 Assignment

Unit 4 Assignment
Unit 4 Assignment

HET 293 Week 4

Read chapter 7 and 8 in Building Code Basics; Residential , Interior and Exterior Finishes and Weather Protection; Home and safety: Egress, Fall Protection, Emergency Escape, and Safety Glazing

- Your Post is due by Wednesday of the current week and you must respond by Saturday night by 11:59 PM.
- Post a two paragraph response to my questions for this week’s subject and respond to at least two classmates
- Discussion: Post a website that adds information to this week’s topic.