Course: HET 293 - HVAC and Building Codes

Unit 6 Assignment

Unit 6 Assignment
Unit 6 Assignment

HET 293 Week 6 Assignments

Read chapter 11 and 12 in Building Code Basics; Residential Chimneys and Fireplaces and Mechanical and Fuel-Gas

- Your Post is due by Wednesday of the current week and you must respond by Saturday night by 11:59 PM.
- Post a two paragraph response to my questions for this week’s subject and respond to at least two classmates
- Discussion: Post a website that adds information to this week’s topic.