Course: HET 293 - HVAC and Building Codes

Unit 5 Assignment

Unit 2 Assignment
HET 293 Week 5 Assignments
Read chapter 9 and 10 in Building Code Basics; Residential , Fire Safety and Light, Ventilation, Heating, and Sanitation
•Your Post is due by Wednesday of the current week and you must respond by Saturday night by 11:59 PM.
•Post a two paragraph response to my questions for this week’s subject and respond to at least two classmates
•Discussion: Post a website that adds information to this week’s topic.