Course: HET 293 - HVAC and Building Codes

Unit 3 Assignment

Unit 3 Assignment

HET 293 Week 3 Assignments

Read chapters 5 and 6 in Building Code Basics: Residential, Foundations  and Framing.

- Discussion: Post a website that adds information to this week’s topic.
- Post a two paragraph response to my questions for this week’s subject and respond to at least two classmates