Title: Discussion Board
Course: HET 293 - HVAC and Building Codes > Section: HET 293 - HVAC and Building Codes

HET 293 Week 8 Discussions

There will be no Discussion this week because you will be working on the final project. You will find the information in Week Eight Assignments.

Good Luck