Course: HET 230 - Spring 2015

Lab Assignment

page 1
Week 1 Lab Assignment
Please complete the following Lab Assignments and submit to the course DropBox.
Click on the file below to download the Lab Assignment
- HET 230 Lab_1_3_Pitot Tube Traverse.pdf (371.67 KB)
- Rectangular Duct Report.pdf (68.86 KB)
- W1 AIR MEASURING INSTRUMENTS.rtf (251.39 KB)
- Week 1 tools list.pdf (60.96 KB)
- HET 230 Week 2 Lab_Calculate Duct Area.doc (26.62 KB)
- HET 230 Lab 2.docx (15.55 KB)