Course: HET 230 - Spring 2015

PowerPoint Lecture

Go to page (1/2)
Power Point Lecture Unit 2

CC By 3.0 College of Lake County

Click on the item below to download the Lecture PowerPoint
- HET 230 Week 02 Calculating Duct Size & Air Quality and Velocity.pdf (972.19 KB)