Course: HET 195 Air Conditioning I Split-Systems - Spring 2015

Unit 5 Outline

Unit 1 Outline
Unit 3 Outline

Objectives

This week’s assignments will support the HVAC learner to:

- Describe education requirement
- Understand specialized knowledge
- Understand personal skills
- Know licensing requirements

Introduction

The career as a residential HVAC installer has special licensing requirement depending on the location. Education is required to do the technical nature of the profession. The residential installer must possess customer service skills. He or she must have the ability to be creative. Layout small projects. Usually the first job for an individual entering residential HVAC.

This Weeks Learning Objectives

1. Education requirements
  - Apprenticeship
  - Post-secondary, Trade school
2. Specialized knowledge
  - Solder/Braze
  - Sheet metal fabrication
  - Blue Print Reading
3. Personal skills
  - Analytical
  - Creative
  - Problem Solver
4. Communication skills
  - Verbal
  - Written
5. Licensing
  - May be required

Summary

- Must have the ability to take a job from concept to completion
- Must handle customers with respect and care
- Ability to change design plan in mid job
- Must have ability to obtain license