Title: HET 194 NATE Certification Preparation - Spring 2015

HET 194 NATE Certification Preparation - Spring 2015
  HET 194 NATE Certification Preparation - Spring 2015 Introduction
  Unit 1
    Unit 1 Introduction
    Unit 1 Outline
    Reading Assignment
      Communication
      Listening
      PDA
      Soft Skills
    PowerPoint Lecture
    Videos
    Unit 1 Quiz
  Unit 2
    Unit 2 Introduction
    Reading
      OSHA
      Safety
    Unit 2 Quiz
  Unit 3
    Unit 3 Introduction
    Unit 3 Outline
    Reading Assignment
      Multi-meter
      Tools
      Voltmeter
    Videos
    PowerPoint Videos
    Unit 3 Quiz
  Unit 4
    Unit 4 Introduction
    Unit 4 Outline
    Reading Assignment
      Multi-meter
      Tools
      Voltmeter
    Videos
    PowerPoint Videos
    Unit 4 Quiz
  Unit 5
    Unit 5 Introduction
    Unit 5 Outline
    Reading Assignments
      Amperage
      Capacitance
      Electrical Field
      Electrical Measurements
      Inductance
      Magnetic Flux
      Resistance
      Voltage
    Videos
    PowerPoint Videos
    Unit 5 Quiz
  Unit 6
    Unit 6 Introduction
    Unit 6 Outline
    Reading Assignment
      Electrical Motors
      Transformer
    Videos
    PowerPoint Videos
    Unit 6 Quiz
  Unit 7
    Unit 7 Introduction
    Unit 7 Outline
    Reading Assignment
      Electrical Diagrams
      Electrical Symbols
      Schematic Diagram
    PowerPoint Videos
    Videos
    Unit 7 Quiz
  Unit 8
    Unit 8 Introduction
    Unit 8 Outline
    Reading Assignment
      Multi-meter
      Ohmmeter
      Tools
      Voltmeter
    Videos
    Final Exam
    PowerPoint Videos
    Unit 8 Quiz