Title: Unit 8 Outline
Course: HET 192 - Spring > Section: HET 192 - Spring

Unit 8 Outline

Unit 1 Outline
Unit 8 Outline

Objectives

This week’s assignments will support the HVAC learner to:

- Describe education requirement
- Understand specialized knowledge
- Understand personal skills
- Know licensing requirements

Introduction

The HVAC/R sheetmetal worker will fabricate duct work and fittings will install sheetmetal systems. He or she must be able to interpret blueprints and system drawings. Be able to weld, solder, cement, and rivet the metal. The sheetmetal worker will use breaks, shears, drills, punches to do the job. He or she must be precise with measurements.

This Weeks Learning Objectives

1. Education requirements
  1. Apprenticeship
  2. Post-secondary, Trade school
  3. Specialized knowledge
    1. Sheet metal fabrication
    2. Blue Print Reading
    3. Layout
    4. Install
    5. Personal skills
      1. Analytical
      2. Creative
      3. Problem Solver
      4. Communication skills
        1. Verbal
        2. Written
        3. Licensing
          1. May be required

Summary

- Uses blueprints and drawings to fabricate ducts and fitting
- Uses many types of machines and hand tools
- May work above floor while installing duct systems