Title: Unit 2 Quiz
Course: HET 192 - Spring > Section: HET 192 - Spring

Q: When working on a piece of electrical equipment, what should be done to prevent it from being accidently turned on?

Q: You should take great care when bending and/or lifting to prevent?

Q: When working with refrigerants, what safety gear should be worn at all times?

Q: How full should a cylinder of refrigerant be filled when recovering?

Q: How should you treat all electrical circuits?