Title: Vocabulary Review
Course: HET 111 HVACR Electricity I - Spring 2015 > Section: HET 111 HVACR Electricity I - Spring 2015

Vocabulary Review

Terms

Term | Definitions
Cold conditions | Working conditions where the ambient air temperature is at or below 50°. This may also include working indoors, such as working in a walking-in freezer. - Wikipedia.org
Hot conditions | Working conditions where the ambient air temperature is at or above 80°. This may also include working indoors, such as working in an attic. - Wikipedia.org
Lock-out-tag-out | Used to secure the power or energy source so work can be performer. - Wikipedia.org
Panel taps | Provide temporary power connection to operate small electrical tools or test equipment. - Wikipedia.org
Personal Safety Protection Equipment | Safety equipment such as safety glasses, respirators, and hearing protection used to protect technicians working in hazards conditionings. - Wikipedia.org
Pressure regulator | Device used to control the pressure of gases coming out of a cylinder. - Wikipedia.org
Refrigeration | The process of transferring heat from one place to a place where it makes little or no difference. -Wikipedia.org
Rotating parts | Gears, pulleys, or fan sheave used to transfer energy from a motor. - Wikipedia.org