Course: HET 111 HVACR Electricity I - Spring 2015

Lab Assignments

page 1
Unit 2 Labs

The following assignments will be completed and submitted during your time spent in the HVAC lab. Please take this opportunity to download and review the assignments by clicking on the links below.
Click on the files below to download documents associated with this assignment.
- Fastener lab.docx (26.67 KB)
- Flaring lab.docx (29.51 KB)
- Tools lab.docx (27.06 KB)